X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2bf8e4ebcc9d52bcee96e69e7013279a4f2efa37..42bf070c7e17428344b476fdb500ab85f0b753df:/docs/latex/wx/strmmem.tex

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index 02b78ab155..920ad7b36e 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -13,7 +13,7 @@
 
 \wxheading{See also}
 
-\helpref{wxStreamBuffer}{wxstreambuffer}
+\helpref{wxStreamBuffer}{wxstreambuffer}, \helpref{wxMemoryOutputStream}{wxmemoutputstream}
 
 % ----------
 % Members
@@ -26,11 +26,11 @@
 
 Initializes a new read-only memory stream which will use the specified buffer
 {\it data} of length {\it len}. The stream does not take ownership of the 
-buffer, i.e. that it will not delete in its constructor.
+buffer, i.e. that it will not delete in its destructor.
 
 \membersection{wxMemoryInputStream::\destruct{wxMemoryInputStream}}
 
-\func{}{\destruct{wxFileInputStream}}{\void}
+\func{}{\destruct{wxMemoryInputStream}}{\void}
 
 Destructor.
 
@@ -60,7 +60,7 @@ Destructor.
 
 \func{}{wxMemoryOutputStream}{\param{char *}{ data = NULL}, \param{size\_t}{ length = 0}}
 
-If \it{data} is NULL, then it will initialize a new empty buffer which will
+If {\it data} is NULL, then it will initialize a new empty buffer which will
 grow if required.
 
 \wxheading{Warning}
@@ -79,7 +79,7 @@ Destructor.
 \constfunc{size\_t}{CopyTo}{\param{char *}{buffer}, \param{size\_t }{len}}
 
 CopyTo allowed you to transfer data from the internal buffer of
-wxMemoryOutputStream to an external buffer. \it{len} specifies the size of
+wxMemoryOutputStream to an external buffer. {\it len} specifies the size of
 the buffer.
 
 \wxheading{Returned value}
