X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2b5f62a0b2db198609b45dec622a018dae37008e..cc20da41278e57396bda09f540fc649663b8ded8:/docs/latex/wx/scrolwin.tex

diff --git a/docs/latex/wx/scrolwin.tex b/docs/latex/wx/scrolwin.tex
index 9507fb04be..58a60fc533 100644
--- a/docs/latex/wx/scrolwin.tex
+++ b/docs/latex/wx/scrolwin.tex
@@ -17,7 +17,7 @@ An additional method of manual control, which requires a little less
 computation of your own, is to set the total size of the scrolling area by
 calling either \helpref{wxWindow::SetVirtualSize}{wxwindowsetvirtualsize},
 or \helpref{wxWindow::FitInside}{wxwindowfitinside}, and setting the
-scrolling increments for it by calling
+scrolling increments for it by calling 
 \helpref{wxScrolledWindow::SetScrollRate}{wxscrolledwindowsetscrollrate}.
 Scrolling in some orientation is enabled by setting a non zero increment
 for it.
@@ -97,7 +97,8 @@ to build your own scroll behaviour.
 
 \wxheading{See also}
 
-\helpref{wxScrollBar}{wxscrollbar}, \helpref{wxClientDC}{wxclientdc}, \helpref{wxPaintDC}{wxpaintdc}
+\helpref{wxScrollBar}{wxscrollbar}, \helpref{wxClientDC}{wxclientdc},\\
+\helpref{wxPaintDC}{wxpaintdc}, \helpref{wxVScrolledWindow}{wxvscrolledwindow}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -211,9 +212,9 @@ is disabled.
 
 \wxheading{Parameters}
 
-\docparam{xScrolling}{If TRUE, enables physical scrolling in the x direction.}
+\docparam{xScrolling}{If true, enables physical scrolling in the x direction.}
 
-\docparam{yScrolling}{If TRUE, enables physical scrolling in the y direction.}
+\docparam{yScrolling}{If true, enables physical scrolling in the y direction.}
 
 \wxheading{Remarks}
 
@@ -310,7 +311,7 @@ parameters and returns a tuple of values for x and y.}
 
 \constfunc{bool}{IsRetained}{\void}
 
-Motif only: TRUE if the window has a backing bitmap.
+Motif only: true if the window has a backing bitmap.
 
 \membersection{wxScrolledWindow::PrepareDC}\label{wxscrolledwindowpreparedc}
 
@@ -384,7 +385,7 @@ that direction).
 \func{void}{SetScrollbars}{\param{int}{ pixelsPerUnitX}, \param{int}{ pixelsPerUnitY},\rtfsp
 \param{int}{ noUnitsX}, \param{int}{ noUnitsY},\rtfsp
 \param{int }{xPos = 0}, \param{int}{ yPos = 0},\rtfsp
-\param{bool }{noRefresh = FALSE}}
+\param{bool }{noRefresh = false}}
 
 Sets up vertical and/or horizontal scrollbars.
 
@@ -402,7 +403,7 @@ Sets up vertical and/or horizontal scrollbars.
 
 \docparam{yPos}{Position to initialize the scrollbars in the vertical direction, in scroll units.}
 
-\docparam{noRefresh}{Will not refresh window if TRUE.}
+\docparam{noRefresh}{Will not refresh window if true.}
 
 \wxheading{Remarks}
 
@@ -435,9 +436,9 @@ adjusting the scrollbars appropriately.
 
 \membersection{wxScrolledWindow::SetScrollRate}\label{wxscrolledwindowsetscrollrate}
 
-\func{void}{SetScrollRate}{\param{int}{xstep}, \param{int}{ystep}}
+\func{void}{SetScrollRate}{\param{int}{ xstep}, \param{int}{ ystep}}
 
-Set the horizontal and vertical scrolling increment only.  See the pixelsPerUnit
+Set the horizontal and vertical scrolling increment only. See the pixelsPerUnit
 parameter in SetScrollbars.
 
 \membersection{wxScrolledWindow::SetTargetWindow}\label{wxscrolledwindowsettargetwindow}
@@ -445,5 +446,5 @@ parameter in SetScrollbars.
 \func{void}{SetTargetWindow}{\param{wxWindow* }{window}}
 
 Call this function to tell wxScrolledWindow to perform the actual scrolling on
-a different window (not on itself).
+a different window (and not on itself).
 
