X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2b5f62a0b2db198609b45dec622a018dae37008e..a663cce7f9ca84a82f1f7359ce1dcd898040a4c1:/docs/latex/wx/valtext.tex

diff --git a/docs/latex/wx/valtext.tex b/docs/latex/wx/valtext.tex
index 87ca0bb22b..0928570119 100644
--- a/docs/latex/wx/valtext.tex
+++ b/docs/latex/wx/valtext.tex
@@ -55,7 +55,7 @@ checks if each input character is in the list (one character per list element),
 
 \docparam{valPtr}{A pointer to a wxString variable that contains the value. This variable
 should have a lifetime equal to or longer than the validator lifetime (which is usually
-determined by the lifetime of the window). % If NULL, the validator uses its own internal storage for the value. NOT TRUE
+determined by the lifetime of the window). % If NULL, the validator uses its own internal storage for the value. NOT true
 }
 
 \membersection{wxTextValidator::\destruct{wxTextValidator}}
