X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2b5f62a0b2db198609b45dec622a018dae37008e..813210ca7e63cb0a8e2a145664c8b638ea65c15e:/docs/latex/wx/timer.tex?ds=inline

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index 262e8332fc..dd845dc16c 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -4,27 +4,31 @@ The wxTimer class allows you to execute code at specified intervals. Its
 precision is platform-dependent, but in general will not be better than 1ms nor
 worse than 1s.
 
-There are two different ways to use this class:
+There are three different ways to use this class:
 
 \begin{enumerate}
 \item You may derive a new class from wxTimer and override the 
 \helpref{Notify}{wxtimernotify} member to perform the required action.
 \item Or you may redirect the notifications to any 
-\helpref{wxEvtHandler}{wxevthandler} derived object by using the non default
-constructor or \helpref{SetOwner}{wxtimersetowner}. Then use {\tt EVT\_TIMER} 
+\helpref{wxEvtHandler}{wxevthandler} derived object by using the non-default
+constructor or \helpref{SetOwner}{wxtimersetowner}. Then use the {\tt EVT\_TIMER} 
 macro to connect it to the event handler which will receive 
 \helpref{wxTimerEvent}{wxtimerevent} notifications.
+\item Or you may use a derived class and the {\tt EVT\_TIMER} 
+macro to connect it to an event handler defined in the derived class.
+If the default constructor is used, the timer object will be its
+own owner object, since it is derived from wxEvtHandler.
 \end{enumerate}
 
 In any case, you must start the timer with \helpref{Start}{wxtimerstart} 
 after constructing it before it actually starts sending notifications. It can
 be stopped later with \helpref{Stop}{wxtimerstop}.
 
-{\bf NB:} note that timer can only be used from the main thread currently.
+{\bf Note:} A timer can only be used from the main thread.
 
 \wxheading{Derived from}
 
-\helpref{wxObject}{wxobject}
+\helpref{wxEvtHandler}{wxevthandler}
 
 \wxheading{Include files}
 
@@ -49,13 +53,13 @@ Default constructor. If you use it to construct the object and don't call
 Creates a timer and associates it with {\it owner}. Please see 
 \helpref{SetOwner}{wxtimersetowner} for the description of parameters.
 
-\membersection{wxTimer::\destruct{wxTimer}}
+\membersection{wxTimer::\destruct{wxTimer}}\label{wxtimerdtor}
 
 \func{}{\destruct{wxTimer}}{\void}
 
 Destructor. Stops the timer if it is running.
 
-\membersection{wxTimer::GetInterval}{wxtimergetinterval}
+\membersection{wxTimer::GetInterval}\label{wxtimergetinterval}
 
 \constfunc{int}{GetInterval}{\void}
 
@@ -65,14 +69,14 @@ Returns the current interval for the timer (in milliseconds).
 
 \constfunc{bool}{IsOneShot}{\void}
 
-Returns {\tt TRUE} if the timer is one shot, i.e.\ if it will stop after firing the
+Returns {\tt true} if the timer is one shot, i.e.\ if it will stop after firing the
 first notification automatically.
 
 \membersection{wxTimer::IsRunning}\label{wxtimerisrunning}
 
 \constfunc{bool}{IsRunning}{\void}
 
-Returns {\tt TRUE} if the timer is running, {\tt FALSE} if it is stopped.
+Returns {\tt true} if the timer is running, {\tt false} if it is stopped.
 
 \membersection{wxTimer::Notify}\label{wxtimernotify}
 
@@ -93,23 +97,23 @@ id equal to {\it id}\/ specified here.
 
 \membersection{wxTimer::Start}\label{wxtimerstart}
 
-\func{bool}{Start}{\param{int}{milliseconds = -1}, \param{bool }{oneShot = {\tt FALSE}}}
+\func{bool}{Start}{\param{int }{milliseconds = -1}, \param{bool }{oneShot = {\tt false}}}
 
 (Re)starts the timer. If {\it milliseconds}\/ parameter is -1 (value by default),
-the previous value is used. Returns {\tt FALSE} if the timer could not be started,
-{\tt TRUE} otherwise (in MS Windows timers are a limited resource).
+the previous value is used. Returns {\tt false} if the timer could not be started,
+{\tt true} otherwise (in MS Windows timers are a limited resource).
 
-If {\it oneShot}\/ is {\tt FALSE} (the default), the \helpref{Notify}{wxtimernotify} 
-function will be called repeatedly until the timer is stopped. If {\tt TRUE},
+If {\it oneShot}\/ is {\tt false} (the default), the \helpref{Notify}{wxtimernotify} 
+function will be called repeatedly until the timer is stopped. If {\tt true},
 it will be called only once and the timer will stop automatically. To make your
-code more readable you may also use the following symbolic constants
-\twocolwidtha{5cm}%
+code more readable you may also use the following symbolic constants:
+
+\twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
 \twocolitem{wxTIMER\_CONTINUOUS}{Start a normal, continuously running, timer}
 \twocolitem{wxTIMER\_ONE\_SHOT}{Start a one shot timer}
 \end{twocollist}
 
-
 If the timer was already running, it will be stopped by this method before
 restarting it.
 
@@ -153,6 +157,10 @@ void MyFrame::OnTimer(wxTimerEvent& event)
 
 \end{verbatim}
 
+\wxheading{Derived from}
+
+\helpref{wxEvent}{wxevent}
+
 \wxheading{Include files}
 
 <wx/timer.h>
