X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2b5f62a0b2db198609b45dec622a018dae37008e..3ac7b44cc0765b8444324d71b58cf648009d41c2:/docs/latex/wx/panel.tex

diff --git a/docs/latex/wx/panel.tex b/docs/latex/wx/panel.tex
index 63b331c13f..1f41e2b6fe 100644
--- a/docs/latex/wx/panel.tex
+++ b/docs/latex/wx/panel.tex
@@ -29,8 +29,6 @@ See also \helpref{window styles overview}{windowstyles}.
 
 By default, a panel has the same colouring as a dialog.
 
-A panel may be loaded from a wxWindows resource file (extension {\tt wxr}).
-
 \wxheading{See also}
 
 \helpref{wxDialog}{wxdialog}
