X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2aa59ef43663cefcc4e76ab4f7ebc49ed0e4bb9e..5824f314a3ac14fb4f4c8c2db7823076fedbbee8:/docs/latex/wx/app.tex

diff --git a/docs/latex/wx/app.tex b/docs/latex/wx/app.tex
index d501e696b6..e894a39d17 100644
--- a/docs/latex/wx/app.tex
+++ b/docs/latex/wx/app.tex
@@ -157,14 +157,12 @@ different visuals, FALSE otherwise.
 
 \helpref{SetUseBestVisual}{wxappsetusebestvisual}
 
-
-\membersection{wxApp::GetVendorName}\label{wxappvendorappname}
+\membersection{wxApp::GetVendorName}\label{wxappgetvendorname}
 
 \constfunc{wxString}{GetVendorName}{\void}
 
 Returns the application's vendor name.
 
-
 \membersection{wxApp::ExitMainLoop}\label{wxappexitmainloop}
 
 \func{void}{ExitMainLoop}{\void}
@@ -468,7 +466,6 @@ wxWindows.
 
 \helpref{wxApp::GetVendorName}{wxappgetvendorname}
 
-
 \membersection{wxApp::GetStdIcon}\label{wxappgetstdicon}
 
 \func{virtual wxIcon}{GetStdIcon}{\param{int }{which}} const
@@ -498,3 +495,4 @@ This function currently only has effect under GTK.
 \wxheading{Parameters}
 
 \docparam{flag}{If TRUE, the app will use the best visual.}
+
