X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2a138829cb011bc427b61d30eb85a6c3ff658455..fb4888a650065c9a24572d6867345f34adafaa37:/docs/latex/wx/dc.tex

diff --git a/docs/latex/wx/dc.tex b/docs/latex/wx/dc.tex
index 8a4bf57e65..7a2a77b2a3 100644
--- a/docs/latex/wx/dc.tex
+++ b/docs/latex/wx/dc.tex
@@ -504,7 +504,7 @@ the rectangle.
 
 \membersection{wxDC::DrawSpline}\label{wxdcdrawspline}
 
-\func{void}{DrawSpline}{\param{int }, \param{wxPoint }{points[]}}
+\func{void}{DrawSpline}{\param{int }{n}, \param{wxPoint }{points[]}}
 
 Draws a spline between all given control points, using the current
 pen.
@@ -907,8 +907,8 @@ doesn't contain anything.
                                 \param{bool}{ yBottomUp}}
 
 Sets the x and y axis orientation (i.e., the direction from lowest to
-highest values on the axis). The default orientation is the natural
-orientation, e.g. x axis from left to right and y axis from bottom up.
+highest values on the axis). The default orientation is 
+x axis from left to right and y axis from top down.
 
 \wxheading{Parameters}
 
