X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/29c8694822a192934278ba0f98eaf437024c0278..27bb69ac80420cf4681182ac9b75260048b77f90:/docs/latex/wx/datectrl.tex?ds=sidebyside

diff --git a/docs/latex/wx/datectrl.tex b/docs/latex/wx/datectrl.tex
index 73f6482eab..637a661b3e 100644
--- a/docs/latex/wx/datectrl.tex
+++ b/docs/latex/wx/datectrl.tex
@@ -40,7 +40,11 @@ components. This style is not supported by the generic version.}
 \twocolitem{\windowstyle{wxDP\_DROPDOWN}}{Creates a control with a month
 calendar drop down part from which the user can select a date.}
 \twocolitem{\windowstyle{wxDP\_DEFAULT}}{Creates a control with default style
-which is the best supported for the current platform.}
+which is the best supported for the current platform (currently wxDP\_SPIN
+under Windows and wxDP\_DROPDOWN elsewhere).}
+\twocolitem{\windowstyle{wxDP\_SHOWCENTURY}}{Forces display of the century in
+the default date format. Without this flas the century could be displayed or
+not depending on the default date representation in the system.}
 \end{twocollist}
 
 \wxheading{Event handling}
@@ -66,7 +70,7 @@ changes the current selection in the control.}
 \param{const wxDateTime\& }{dt = wxDefaultDateTime},\rtfsp
 \param{const wxPoint\& }{pos = wxDefaultPosition},\rtfsp
 \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
-\param{long}{ style = wxDP\_DEFAULT},\rtfsp
+\param{long}{ style = wxDP\_DEFAULT | wxDP\_SHOWCENTURY},\rtfsp
 \param{const wxValidator\& }{validator = wxDefaultValidator},
 \param{const wxString\& }{name = ``datectrl"}}
 
@@ -81,7 +85,7 @@ all the parameters.
 \param{const wxDateTime\& }{dt = wxDefaultDateTime},\rtfsp
 \param{const wxPoint\& }{pos = wxDefaultPosition},\rtfsp
 \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
-\param{long}{ style = wxDP\_DEFAULT},\rtfsp
+\param{long}{ style = wxDP\_DEFAULT | wxDP\_SHOWCENTURY},\rtfsp
 \param{const wxValidator\& }{validator = wxDefaultValidator},
 \param{const wxString\& }{name = ``datectrl"}}
 
