X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/298fe32f7a9a1257e4cdc0c07c8698984eb5f4fe..c66c3af1353948c39b05ab03c7314d6f999419d0:/docs/latex/wx/wxmgl.tex?ds=inline

diff --git a/docs/latex/wx/wxmgl.tex b/docs/latex/wx/wxmgl.tex
index 3468368bca..916dde737a 100644
--- a/docs/latex/wx/wxmgl.tex
+++ b/docs/latex/wx/wxmgl.tex
@@ -11,16 +11,17 @@ Note that currently MGL for Linux runs only on x86-based systems.
 You will need wxWindows 2.3.3 or higher and MGL 5.0 or higher.
 The latter is available from
 
-\urlref{http://www.scitechsoft.com/products/product_download.html}{http://www.scitechsoft.com/products/product_download.html}
+\urlref{http://www.scitechsoft.com/products/product\_download.html}{http://www.scitechsoft.com/products/product\_download.html}
 
-In order to configure wxWindows to compile wxMGL you will 
+In order to configure wxWindows to compile wxMGL you will
 need to type:
 
 \begin{verbatim}
   configure --with-mgl --with-universal
 \end{verbatim}
-  
+
 Under DOS, wxMGL uses a dmake based make system.
 
 For further information, please see the files in docs/mgl
 in the distribution.
+
