X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/297ebe6b9749bba3ad8e7adb004f1ed390895c9c..fb4888a650065c9a24572d6867345f34adafaa37:/docs/latex/wx/dynlib.tex?ds=inline

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index c1c3dcc48f..f29e1ca6d1 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -6,7 +6,7 @@
 %% Created:     14.01.02 (extracted from dllload.tex)
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxDynamicLibrary}}\label{wxdynamiclibrary}
@@ -147,6 +147,7 @@ be a combination of the following bits:
 \twocolitem{wxDL\_GLOBAL}{equivalent of RTLD\_GLOBAL under Unix, ignored elsewhere}
 \twocolitem{wxDL\_VERBATIM}{don't try to append the appropriate extension to
 the library name (this is done by default).}
+\twocolitem{wxDL\_DEFAULT}{default flags, same as wxDL\_NOW currently}
 \end{twocollist}
 
 Returns \true if the library was successfully loaded, \false otherwise.
