X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/296ec7d3ac9047b1655b789506c02b2f5f13cabf..d45d30c8682f858321600e2958167d7ef54ebeb5:/docs/latex/wx/url.tex

diff --git a/docs/latex/wx/url.tex b/docs/latex/wx/url.tex
index 5b9963ce1f..664c004f99 100644
--- a/docs/latex/wx/url.tex
+++ b/docs/latex/wx/url.tex
@@ -62,6 +62,15 @@ Returns the name of the protocol which will be used to get the URL.
 
 Returns a reference to the protocol which will be used to get the URL.
 
+%
+% GetPath
+%
+\membersection{wxURL::GetPath}
+
+\func{wxString}{GetPath}{\void}
+
+Returns the path of the file to fetch. This path was encoded in the URL.
+
 %
 % GetError
 %
@@ -134,3 +143,13 @@ Sets the proxy to use for this URL.
 
 \helpref{wxURL::SetDefaultProxy}{wxurlsetdefaultproxy}
 
+%
+% SetProxy
+%
+\membersection{wxURL::ConvertToValidURI}
+
+\func{static wxString}{ConvertToValidURI}{\param{const wxString\&}{ uri}}
+
+It converts a non-standardized URI to a valid network URI. It encodes non
+standard characters.
+
