X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/294e9a7aa00c23de9aad973b3998071b81159aee..ff7047fde523c91a0065a6f1028ee87a7cba5a88:/docs/latex/wx/outptstr.tex?ds=sidebyside

diff --git a/docs/latex/wx/outptstr.tex b/docs/latex/wx/outptstr.tex
index 74378c89b6..0eb87f886e 100644
--- a/docs/latex/wx/outptstr.tex
+++ b/docs/latex/wx/outptstr.tex
@@ -3,6 +3,8 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxOutputStream}}\label{wxoutputstream}
 
+wxOutputStream is an abstract base class which may not be used directly.
+
 \wxheading{Derived from}
 
 \helpref{wxStreamBase}{wxstreambase}
@@ -11,9 +13,7 @@
 
 <wx/stream.h>
 
-\wxheading{See also}
-
-\helpref{wxStreamBuffer}{wxstreambuffer}
+\latexignore{\rtfignore{\wxheading{Members}}}
 
 % -----------
 % ctor & dtor
@@ -24,27 +24,18 @@
 
 Creates a dummy wxOutputStream object.
 
-\func{}{wxOutputStream}{\param{wxStreamBuffer*}{ sbuf}}
-
-Creates an input stream using the specified stream buffer \it{sbuf}. This
-stream buffer can point to another stream.
-
 \membersection{wxOutputStream::\destruct{wxOutputStream}}
 
 \func{}{\destruct{wxOutputStream}}{\void}
 
 Destructor.
 
-\membersection{wxOutputStream::OutputStreamBuffer}
-
-\func{wxStreamBuffer *}{OutputStreamBuffer}{\void}
-
-Returns the stream buffer associated with the output stream.
-
 \membersection{wxOutputStream::LastWrite}
 
 \constfunc{size\_t}{LastWrite}{\void}
 
+Returns the number of bytes written during the last Write().
+
 \membersection{wxOutputStream::PutC}
 
 \func{void}{PutC}{\param{char}{ c}}
@@ -68,8 +59,8 @@ Returns the current stream position.
 
 \func{wxOutputStream\&}{Write}{\param{const void *}{buffer}, \param{size\_t}{ size}}
 
-Writes the specified amount of bytes using the data of \it{buffer}. 
-\it{WARNING!} The buffer absolutely needs to have at least the specified size.
+Writes the specified amount of bytes using the data of {\it buffer}. 
+{\it WARNING!} The buffer absolutely needs to have at least the specified size.
 
 This function returns a reference on the current object, so the user can test
 any states of the stream right away.
