X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/294e9a7aa00c23de9aad973b3998071b81159aee..7c4eef7a75398aab1285e3ad2971c59ea3130293:/docs/latex/wx/strmbase.tex

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 7876d607b5..5cc9320525 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -76,9 +76,9 @@ real position in the stream.
 
 See \helpref{OnSysRead}{wxstreambaseonsysread}.
 
-\membersection{wxStreamBase::StreamSize}
+\membersection{wxStreamBase::GetSize}\label{wxstreambasegetsize}
 
-\constfunc{size\_t}{StreamSize}{\void}
+\constfunc{size\_t}{GetSize}{\void}
 
 This function returns the size of the stream. For example, for a file it is the size of
 the file).
@@ -86,7 +86,7 @@ the file).
 \wxheading{Warning}
 
 There are streams which do not have size by definition, such as socket streams.
-In that cases, StreamSize returns an invalid size represented by
+In that cases, GetSize returns an invalid size represented by
 
 \begin{verbatim}
 ~(size_t)0
