X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/28ca76100ebffe6698f4ee33a503b5b1c21168fc..afbe906abdf9aa69a56571b8b20b095351dd8f34:/docs/latex/wx/radiobox.tex

diff --git a/docs/latex/wx/radiobox.tex b/docs/latex/wx/radiobox.tex
index 8414735752..f1e9a81d00 100644
--- a/docs/latex/wx/radiobox.tex
+++ b/docs/latex/wx/radiobox.tex
@@ -198,7 +198,7 @@ Returns the selected string.
 \constfunc{int}{Number}{\void}
 
 {\bf Obsolescence note:} This method is obsolete and was replaced with 
-\helpref{GetCount}{wxradiooboxgetcount}, please use the new method in the new
+\helpref{GetCount}{wxradioboxgetcount}, please use the new method in the new
 code. This method is only available if wxWindows was compiled with 
 {\tt WXWIN\_COMPATIBILITY\_2\_2} defined and will disappear completely in
 future versions.
