X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/28ca76100ebffe6698f4ee33a503b5b1c21168fc..0532a2588121690115f4629cdcbc41d2049e50c0:/docs/latex/wx/radiobox.tex?ds=sidebyside

diff --git a/docs/latex/wx/radiobox.tex b/docs/latex/wx/radiobox.tex
index 8414735752..72f27204b6 100644
--- a/docs/latex/wx/radiobox.tex
+++ b/docs/latex/wx/radiobox.tex
@@ -113,11 +113,11 @@ for further details.
 
 \membersection{wxRadioBox::Enable}\label{wxradioboxenable}
 
-\func{void}{Enable}{\param{const bool}{ enable}}
+\func{void}{Enable}{\param{bool}{ enable = {\tt TRUE}}}
 
 Enables or disables the entire radiobox.
 
-\func{void}{Enable}{\param{int}{ n}, \param{const bool}{ enable}}
+\func{void}{Enable}{\param{int}{ n}, \param{bool}{ enable = {\tt TRUE}}}
 
 Enables or disables an individual button in the radiobox.
 
@@ -198,7 +198,7 @@ Returns the selected string.
 \constfunc{int}{Number}{\void}
 
 {\bf Obsolescence note:} This method is obsolete and was replaced with 
-\helpref{GetCount}{wxradiooboxgetcount}, please use the new method in the new
+\helpref{GetCount}{wxradioboxgetcount}, please use the new method in the new
 code. This method is only available if wxWindows was compiled with 
 {\tt WXWIN\_COMPATIBILITY\_2\_2} defined and will disappear completely in
 future versions.
