X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2723cfeba2a842e82d7473f7d17c5038f80f7f43..3b415ba4cdee694574d7235ff0b8341f105cddfe:/docs/latex/wx/tstream.tex

diff --git a/docs/latex/wx/tstream.tex b/docs/latex/wx/tstream.tex
index 9c407d2d04..9bb13376ab 100644
--- a/docs/latex/wx/tstream.tex
+++ b/docs/latex/wx/tstream.tex
@@ -1,4 +1,4 @@
-\section{Streams in wxWindows overview}\label{wxstreamoverview}
+\section{wxStreams overview}\label{wxstreamoverview}
 
 Classes: \helpref{wxStreamBase}{wxstreambase},
  \helpref{wxStreamBuffer}{wxstreambuffer}, \helpref{wxInputStream}{wxinputstream},
@@ -62,13 +62,13 @@ code:
 
  // Ok, read some bytes ... nb_datas is expressed in bytes.
  in_stream.Read(data, nb_datas);
- if (in_stream.LastError() != wxStream_NOERROR) {
+ if (in_stream.LastError() != wxSTREAM_NOERROR) {
    // Oh oh, something bad happens.
    // For a complete list, look into the documentation at wxStreamBase.
  }
 
  // You can also inline all like this.
- if (in_stream.Read(data, nb_datas).LastError() != wxStream_NOERROR) {
+ if (in_stream.Read(data, nb_datas).LastError() != wxSTREAM_NOERROR) {
    // Do something.
  }
 
