X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2531c7e393e87dabaf6ae20301044ad893cb3ece..a9249b2eb2a40d8c71f828669045c4ddaa8dc5ff:/docs/latex/wx/timer.tex

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index 05e5f0e1c7..97939eb2ba 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -34,7 +34,7 @@ be stopped later with \helpref{Stop}{wxtimerstop}.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxTimer::wxTimer}{wxtimerctordef}
+\membersection{wxTimer::wxTimer}\label{wxtimerwxtimer}
 
 \func{}{wxTimer}{\void}
 
@@ -42,8 +42,6 @@ Default constructor. If you use it to construct the object and don't call
 \helpref{SetOwner}{wxtimersetowner} later, you must override 
 \helpref{Notify}{wxtimernotify} method to process the notifications.
 
-\membersection{wxTimer::wxTimer}{wxtimerwxtimer}
-
 \func{}{wxTimer}{\param{wxEvtHandler *}{owner}, \param{int }{id = -1}}
 
 Creates a timer and associates it with {\it owner}. Please see 
@@ -61,20 +59,20 @@ Destructor. Stops the timer if it is running.
 
 Returns the current interval for the timer (in milliseconds).
 
-\membersection{wxTimer::IsOneShot}{wxtimerisoneshot}
+\membersection{wxTimer::IsOneShot}\label{wxtimerisoneshot}
 
 \constfunc{bool}{IsOneShot}{\void}
 
 Returns TRUE if the timer is one shot, i.e. if it will stop after firing the
 first notification automatically.
 
-\membersection{wxTimer::IsRunning}{wxtimerisrunning}
+\membersection{wxTimer::IsRunning}\label{wxtimerisrunning}
 
 \constfunc{bool}{IsRunning}{\void}
 
 Returns TRUE if the timer is running, FALSE if it is stopped.
 
-\membersection{wxTimer::Notify}{wxtimernotify}
+\membersection{wxTimer::Notify}\label{wxtimernotify}
 
 \func{void}{Notify}{\void}
 
@@ -83,7 +81,7 @@ used and \helpref{SetOwner}{wxtimersetowner} wasn't called.
 
 Perform whatever action which is to be taken periodically here.
 
-\membersection{wxTimer::SetOwner}{wxtimersetowner}
+\membersection{wxTimer::SetOwner}\label{wxtimersetowner}
 
 \func{void}{SetOwner}{\param{wxEvtHandler *}{owner}, \param{int }{id = -1}}
 
@@ -91,7 +89,7 @@ Associates the timer with the given {\it owner} object. When the timer is
 running, the owner will receive \helpref{timer events}{wxtimerevent} with
 id equal to {\it id} specified here.
 
-\membersection{wxTimer::Start}{wxtimerstart}
+\membersection{wxTimer::Start}\label{wxtimerstart}
 
 \func{bool}{Start}{\param{int}{ milliseconds = -1}, \param{bool}{ oneShot=FALSE}}
 
@@ -103,7 +101,10 @@ If {\it oneShot} is FALSE (the default), the \helpref{Notify}{wxtimernotify}
 function will be called repeatedly until the timer is stopped. If TRUE,
 it will be called only once and the timer will stop automatically.
 
-\membersection{wxTimer::Stop}{wxtimerstop}
+If the timer was already running, it will be stopped by this method before
+restarting it.
+
+\membersection{wxTimer::Stop}\label{wxtimerstop}
 
 \func{void}{Stop}{\void}
 
@@ -153,54 +154,9 @@ void MyFrame::OnTimer(wxTimerEvent& event)
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxTimerEvent::GetInterval}{wxtimereventgetinterval}
+\membersection{wxTimerEvent::GetInterval}\label{wxtimereventgetinterval}
 
 \constfunc{int}{GetInterval}{\void}
 
 Returns the interval of the timer which generated this event.
 
-\section{\class{wxStopWatch}}\label{wxstopwatch}
-
-The wxStopWatch class allow you to measure time intervalls. 
-
-\wxheading{Include files}
-
-<wx/timer.h>
-
-\wxheading{See also}
-
-\helpref{::wxStartTimer}{wxstarttimer}, \helpref{::wxGetElapsedTime}{wxgetelapsedtime}, \helpref{wxTimer}{wxtimer}
-
-\latexignore{\rtfignore{\wxheading{Members}}}
-
-\membersection{wxStopWatch::wxStopWatch}
-
-\func{}{wxStopWatch}{\void}
-
-Constructor. This starts the stop watch.
-
-\membersection{wxStopWatch::Pause}\label{wxstopwatchpause}
-
-\func{void}{Pause}{\void}
-
-Pauses the stop watch. Call \helpref{wxStopWatch::Resume}{wxstopwatchresume} to resume 
-time measuring again.
-
-\membersection{wxStopWatch::Start}
-
-\func{void}{Start}{\param{long}{ milliseconds = 0}}
-
-(Re)starts the stop watch with a given initial value.
-
-\membersection{wxStopWatch::Resume}\label{wxstopwatchresume}
-
-\func{void}{Resume}{\void}
-
-Resumes the stop watch after having been paused with \helpref{wxStopWatch::Pause}{wxstopwatchpause}.
-
-\membersection{wxStopWatch::Time}
-
-\func{long}{Time}{\void}\label{wxstopwatchtime}
-
-Returns the time in milliseconds since the start (or restart) or the last call of 
-\helpref{wxStopWatch::Pause}{wxstopwatchpause}.
