X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2531c7e393e87dabaf6ae20301044ad893cb3ece..4c7852186d48a5b8f406462c2c3fa020f0a052bb:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 9f134c6ac7..7c1c99b309 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -204,6 +204,12 @@ and refreshes the window.
 
 Sets the number of fields, and optionally the field widths.
 
+\pythonnote{Only the first parameter is accepted.  Use SetStatusWidths
+to set the widths of the fields.}
+
+\perlnote{In wxPerl this function acceps only the {\tt n} parameter.
+Use SetStatusWidths to set the field widths.}
+
 \wxheading{Parameters}
 
 \docparam{number}{The number of fields.}
@@ -263,4 +269,5 @@ variable fields.
 \pythonnote{Only a single parameter is required, a Python list of
 integers.}
 
+\perlnote{In wxPerl this method takes as parameters the field widths.}
 
