X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2531c7e393e87dabaf6ae20301044ad893cb3ece..1b113a811d9b29afb89ea5a4e192c187906f3b9b:/docs/latex/wx/statusbr.tex?ds=sidebyside

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 9f134c6ac7..172178f3a0 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -204,6 +204,9 @@ and refreshes the window.
 
 Sets the number of fields, and optionally the field widths.
 
+\pythonnote{Only the first parameter is accepted.  Use SetStatusWidths
+to set the widths of the fields.}
+
 \wxheading{Parameters}
 
 \docparam{number}{The number of fields.}
