X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2432b92dd7a837db13d3938a56c1959decd03203..f811bc9ac07404a8e90570b243918d11289ef1e2:/docs/latex/wx/mutexlck.tex

diff --git a/docs/latex/wx/mutexlck.tex b/docs/latex/wx/mutexlck.tex
index 1db3945ac8..5fa53b7354 100644
--- a/docs/latex/wx/mutexlck.tex
+++ b/docs/latex/wx/mutexlck.tex
@@ -11,6 +11,10 @@ usage.
 
 None.
 
+\wxheading{Include files}
+
+<wx/thread.h>
+
 \wxheading{See also}
 
 \helpref{wxMutex}{wxmutex}, \helpref{wxCriticalSectionLocker}{wxcriticalsectionlocker}
@@ -21,7 +25,7 @@ None.
 
 \func{}{wxMutexLocker}{\param{wxMutex *}{mutex}}
 
-Constructs a wxMutexLocker object associated with mutex which must be non NULL
+Constructs a wxMutexLocker object associated with mutex which must be non-NULL
 and locks it. Call \helpref{IsLocked}{wxmutexlockerisok} to check if the mutex was
 successfully locked.
 
@@ -29,7 +33,7 @@ successfully locked.
 
 \func{}{\destruct{wxMutexLocker}}{\void}
 
-Destuctor releases the mutex if it was successfully acquired in the ctor.
+Destructor releases the mutex if it was successfully acquired in the ctor.
 
 \membersection{wxMutexLocker::IsOk}\label{wxmutexlockerisok}
 
