X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/23fb9116c3828760178f297e5c7bf61208362838..07fa8f78f82cd01ef4034a489419da9e86499b18:/docs/latex/wx/filename.tex?ds=sidebyside

diff --git a/docs/latex/wx/filename.tex b/docs/latex/wx/filename.tex
index 2ec4d49ad6..870e8a53d8 100644
--- a/docs/latex/wx/filename.tex
+++ b/docs/latex/wx/filename.tex
@@ -24,14 +24,14 @@ make sure not to misuse the file name part of this class with the last
 directory. Instead initialize the wxFileName instance like this:
 
 \begin{verbatim}
-wxFileName dirname( wxT("C:\mydir"), wxEmptyString );
+wxFileName dirname( "C:\mydir", "" );
 MyMethod( dirname.GetPath() );
 \end{verbatim}
 
 The same can be done using the static method \helpref{wxFileName::DirName}{wxfilenamedirname}:
 
 \begin{verbatim}
-wxFileName dirname = wxFileName::DirName( wxT("C:\mydir") );
+wxFileName dirname = wxFileName::DirName( "C:\mydir" );
 MyMethod( dirname.GetPath() );
 \end{verbatim}
 
@@ -68,6 +68,10 @@ No base class
 
 <wx/filename.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{Data structures}
 
 Many wxFileName methods accept the path format argument which is by\rtfsp
@@ -84,7 +88,7 @@ enum wxPathFormat
     wxPATH_NATIVE = 0,      // the path format for the current platform
     wxPATH_UNIX,
     wxPATH_BEOS = wxPATH_UNIX,
-    wxPATH_MAC,
+    wxPATH_MAC,             // the old HFS format, deprecated
     wxPATH_DOS,
     wxPATH_WIN = wxPATH_DOS,
     wxPATH_OS2 = wxPATH_DOS,
