X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/23efb556d96ee8bf71f38f208b0f9230d7555a30..bc253a97e78b2c42b93c1f3cc8e1bcceec68a336:/docs/latex/wx/conditn.tex

diff --git a/docs/latex/wx/conditn.tex b/docs/latex/wx/conditn.tex
index 42fef3052e..52dfc70846 100644
--- a/docs/latex/wx/conditn.tex
+++ b/docs/latex/wx/conditn.tex
@@ -13,8 +13,12 @@ worker threads it already makes much more sense).
 
 Note that a call to \helpref{Signal()}{wxconditionsignal} may happen before the
 other thread calls \helpref{Wait()}{wxconditionwait} and, just as with the
-pthread conditions, the signal is then lost and so if you want to be sure to
-get it you must use a mutex together with the condition variable.
+pthread conditions, the signal is then lost and so if you want to be sure that
+you don't miss it you must keep the mutex associated with the condition
+initially locked and lock it again before calling 
+\helpref{Signal()}{wxconditionsignal}. Of course, this means that this call is
+going to block until \helpref{Wait()}{wxconditionwait} is called by another
+thread.
 
 \wxheading{Example}
 
