X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/23ac76056fd0ae75149dab806fc266e6ee9b0115..0a82af9b91531b630c1b46c2acc044fe4bdb0ebd:/docs/latex/wx/gauge.tex?ds=sidebyside

diff --git a/docs/latex/wx/gauge.tex b/docs/latex/wx/gauge.tex
index 49bf0d7346..04126ed292 100644
--- a/docs/latex/wx/gauge.tex
+++ b/docs/latex/wx/gauge.tex
@@ -224,3 +224,4 @@ a bit to indicate the user that some progress has been made.
 Note that after calling this function the value returned by \helpref{GetValue}{wxgaugegetvalue}
 is undefined and thus you need to explicitely call \helpref{SetValue}{wxgaugesetvalue} if you
 want to restore the determinate mode.
+
