X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2373946593915777d45172bfbfebc50501f3e3c3..ff7282e135ce73ca6fc4fb4ef037ea2808401272:/docs/latex/wx/listctrl.tex

diff --git a/docs/latex/wx/listctrl.tex b/docs/latex/wx/listctrl.tex
index 538cc1942a..a3ef301c66 100644
--- a/docs/latex/wx/listctrl.tex
+++ b/docs/latex/wx/listctrl.tex
@@ -38,6 +38,12 @@ Using many of wxListCtrl features is shown in the
 To intercept events from a list control, use the event table macros described
 in \helpref{wxListEvent}{wxlistevent}.
 
+{\bf Mac Note:} Starting with 2.8, wxListCtrl uses a native implementation for 
+report mode, and uses a generic implementation for other modes. You can use the
+generic implementation for report mode as well by setting the
+mac.listctrl.always\_use\_generic \helpref{wxSystemOption}{wxsystemoptions} to
+1.
+
 \wxheading{Derived from}
 
 \helpref{wxControl}{wxcontrol}\\
@@ -328,7 +334,8 @@ or small icon view).
 Returns the edit control being currently used to edit a label. Returns {\tt NULL}
 if no label is being edited.
 
-{\bf NB:} It is currently only implemented for wxMSW.
+{\bf NB:} It is currently only implemented for wxMSW and the generic version,
+not for the native Mac OS X version.
 
 
 \membersection{wxListCtrl::GetImageList}\label{wxlistctrlgetimagelist}
