X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2319d2b09a8c77b81747074a1ad1ebb741a47843..44c4a3348693414bace13852e50d926c1aa9f08b:/docs/latex/wx/config.tex?ds=sidebyside

diff --git a/docs/latex/wx/config.tex b/docs/latex/wx/config.tex
index 95c0c13616..af679b31a5 100644
--- a/docs/latex/wx/config.tex
+++ b/docs/latex/wx/config.tex
@@ -545,7 +545,7 @@ Reads a double value, returning TRUE if the value was found. If the value was
 not found, {\it d} is not changed.
 
 \constfunc{bool}{Read}{\param{const wxString\& }{ key}, \param{double*}{ d},
-\param{double}{ defaultVal}}
+ \param{double}{ defaultVal}}
 
 Reads a double value, returning TRUE if the value was found. If the value was
 not found, {\it defaultVal} is used instead.
