X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/22d6efa851642c6a69174278fc50f712f41e2271..d7da975624b24ca0b243e9e70974ecaf9047c50a:/docs/latex/wx/statline.tex

diff --git a/docs/latex/wx/statline.tex b/docs/latex/wx/statline.tex
index 3c506f9e72..d304f367f3 100644
--- a/docs/latex/wx/statline.tex
+++ b/docs/latex/wx/statline.tex
@@ -78,7 +78,7 @@ Returns TRUE if the line is vertical, FALSE if horizontal.
 
 \func{int}{GetDefaultSize}{\void}
 
-This static function returns the size which will be given to the "lesser"
+This static function returns the size which will be given to the smaller
 dimension of the static line, i.e. its height for a horizontal line or its
 width for a vertical one.
 
