X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/22d6efa851642c6a69174278fc50f712f41e2271..c914e99ed52d2899c70f783e8ffb54d75efae213:/docs/latex/wx/statline.tex

diff --git a/docs/latex/wx/statline.tex b/docs/latex/wx/statline.tex
index 3c506f9e72..93f62a82ae 100644
--- a/docs/latex/wx/statline.tex
+++ b/docs/latex/wx/statline.tex
@@ -34,7 +34,7 @@ groups of controls. The line may be only vertical or horizontal.
 
 Default constructor.
 
-\func{}{wxStaticLine}{\param{wxWindow* }{parent}, \param{wxWindowID }{id}, \param{const wxString\& }{label},\rtfsp
+\func{}{wxStaticLine}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
 \param{const wxPoint\&}{ pos = wxDefaultPosition}, \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
 \param{long}{ style = wxLI\_HORIZONTAL}, \param{const wxString\& }{name = ``staticLine"}}
 
@@ -61,7 +61,7 @@ whether the line if horizontal or vertical) is ignored.}
 
 \membersection{wxStaticLine::Create}\label{wxstaticlinecreate}
 
-\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id}, \param{const wxString\& }{label},\rtfsp
+\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
 \param{const wxPoint\&}{ pos = wxDefaultPosition}, \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
 \param{long}{ style = 0}, \param{const wxString\& }{name = ``staticLine"}}
 
@@ -78,7 +78,7 @@ Returns TRUE if the line is vertical, FALSE if horizontal.
 
 \func{int}{GetDefaultSize}{\void}
 
-This static function returns the size which will be given to the "lesser"
+This static function returns the size which will be given to the smaller
 dimension of the static line, i.e. its height for a horizontal line or its
 width for a vertical one.
 
