X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/22d6efa851642c6a69174278fc50f712f41e2271..8a7f3379ba1f91b3374448626d8469f1439f9d20:/docs/latex/wx/url.tex

diff --git a/docs/latex/wx/url.tex b/docs/latex/wx/url.tex
index 664c004f99..c648fb918a 100644
--- a/docs/latex/wx/url.tex
+++ b/docs/latex/wx/url.tex
@@ -89,7 +89,7 @@ It can be one of these errors:
 \twocolitem{{\bf wxURL\_NOHOST}}{An host name is required for this protocol.}
 \twocolitem{{\bf wxURL\_NOPATH}}{A path is required for this protocol.}
 \twocolitem{{\bf wxURL\_CONNERR}}{Connection error.}
-\twocolitem{{\bf wxURL\_PROTOERR}}{An error occured during negotiation.}
+\twocolitem{{\bf wxURL\_PROTOERR}}{An error occurred during negotiation.}
 \end{twocollist}%
 
 %
@@ -109,8 +109,7 @@ Returns the initialized stream. You will have to delete it yourself.
 
 \wxheading{See also}
 
-%\helpref{wxInputStream}{wxinputstream}
-wxInputStream
+\helpref{wxInputStream}{wxinputstream}
 
 %
 % SetDefaultProxy
