X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/22d6efa851642c6a69174278fc50f712f41e2271..60b73526d6797ee466c272dbfca962a230bc5908:/docs/latex/wx/settings.tex

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index 2882173e62..88474c6b89 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -69,7 +69,7 @@ Returns a system colour.
 \end{twocollist}
 
 \pythonnote{This static method is implemented in Python as a
-standalone function named \tt{wxSystemSettings_GetSystemColour}}
+standalone function named {\tt wxSystemSettings\_GetSystemColour}}
 
 \membersection{wxSystemSettings::GetSystemFont}\label{wxsystemsettingsgetsystemfont}
 
@@ -91,7 +91,7 @@ Not available in versions of Windows earlier than Windows 95 or Windows NT 4.0.}
 \end{twocollist}
 
 \pythonnote{This static method is implemented in Python as a
-standalone function named \tt{wxSystemSettings_GetSystemFont}}
+standalone function named {\tt wxSystemSettings\_GetSystemFont}}
 
 \membersection{wxSystemSettings::GetSystemMetric}\label{wxsystemsettingsgetsystemmetric}
 
@@ -150,5 +150,5 @@ where it would otherwise present the information only in audible form; zero othe
 \end{twocollist}
 
 \pythonnote{This static method is implemented in Python as a
-standalone function named \tt{wxSystemSettings_GetSystemMetric}}
+standalone function named {\tt wxSystemSettings\_GetSystemMetric}}
 
