X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/22d6efa851642c6a69174278fc50f712f41e2271..43e995b6e39d41fd8a26f8bb9e6a6ef54bbcd324:/docs/latex/wx/http.tex

diff --git a/docs/latex/wx/http.tex b/docs/latex/wx/http.tex
index 0df37561ff..5f9fcc585f 100644
--- a/docs/latex/wx/http.tex
+++ b/docs/latex/wx/http.tex
@@ -17,30 +17,35 @@
 % ----------------------------------------------------------------------------
 
 % ----------------------------------------------------------------------------
+\membersection{wxHTTP::GetResponse}\label{wxhttpgetresponse}
+
+\constfunc{int}{GetResponse}{\void}
+
+Returns the HTTP response code returned by the server. Please refer to
+\urlref{RFC 2616}{http://www.faqs.org/rfcs/rfc2616.html} for the list of responses.
+
+
 \membersection{wxHTTP::GetInputStream}\label{wxhttpgetinputstream}
 
 \func{wxInputStream *}{GetInputStream}{\param{const wxString\&}{ path}}
 
-Creates a new input stream on the the specified path. You can use all except the seek
-functionality of wxStream. Seek isn't available on all streams. For example,
-http or ftp streams doesn't deal with it. Other functions like Tell and SeekI
-for this sort of stream.
-You will be notified when the EOF is reached by an error.
-
-\wxheading{Note}
+Creates a new input stream on the specified path. Notice that this stream is
+unseekable, i.e. SeekI() and TellI() methods shouldn't be used.
 
-You can know the size of the file you are getting using \helpref{wxStreamBase::GetSize()}{wxstreambasegetsize}.
-But there is a limitation: as HTTP servers aren't obliged to pass the size ofi
-the file, in some case, you will be returned 0xfffffff by GetSize(). In these
-cases, you should use the value returned by \helpref{wxInputStream::LastRead()}{wxinputstreamlastread}:
-this value will be 0 when the stream is finished.
+Note that you can still know the size of the file you are getting using 
+\helpref{wxStreamBase::GetSize()}{wxstreambasegetsize}. However there is a
+limitation: in HTTP protocol, the size is not always specified so sometimes
+\texttt{(size\_t)-1} can returned ot indicate that the size is unknown. In such
+case, you may want to use \helpref{wxInputStream::LastRead()}{wxinputstreamlastread} 
+method in a loop to get the total size.
 
 \wxheading{Return value}
 
-Returns the initialized stream. You will have to delete it yourself once you
-don't use it anymore. The destructor closes the network connection.
-The next time you will try to get a file the network connection will have
-to be reestablished: but you don't have to take care of this wxHTTP reestablishes it automatically.
+Returns the initialized stream. You must delete it yourself once you
+don't use it anymore and this must be done before the wxHTTP object itself is
+destroyed. The destructor closes the network connection. The next time you will
+try to get a file the network connection will have to be reestablished, but you
+don't have to take care of this since wxHTTP reestablishes it automatically.
 
 \wxheading{See also}
 
@@ -48,23 +53,23 @@ to be reestablished: but you don't have to take care of this wxHTTP reestablishe
 
 % ----------------------------------------------------------------------------
 
-\membersection{wxHTTP::SetHeader}
+\membersection{wxHTTP::SetHeader}\label{wxhttpsetheader}
 
 \func{void}{SetHeader}{\param{const wxString\&}{ header}, \param{const wxString\&}{ h\_data}}
 
 It sets data of a field to be sent during the next request to the HTTP server. The field
-name is specified by \it{header} and the content by \it{h\_data}.
+name is specified by {\it header} and the content by {\it h\_data}.
 This is a low level function and it assumes that you know what you are doing.
 
-\membersection{wxHTTP::GetHeader}
+\membersection{wxHTTP::GetHeader}\label{wxhttpgetheader}
 
 \func{wxString}{GetHeader}{\param{const wxString\&}{ header}}
 
-Returns the data attached with a field whose name is specified by \it{header}.
+Returns the data attached with a field whose name is specified by {\it header}.
 If the field doesn't exist, it will return an empty string and not a NULL string.
 
 \wxheading{Note}
 
-The header is not case-sensitive: I mean that "CONTENT-TYPE" and "content-type" 
+The header is not case-sensitive, i.e. "CONTENT-TYPE" and "content-type" 
 represent the same header.
 
