X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/22d6efa851642c6a69174278fc50f712f41e2271..3b415ba4cdee694574d7235ff0b8341f105cddfe:/docs/latex/wx/url.tex

diff --git a/docs/latex/wx/url.tex b/docs/latex/wx/url.tex
index 664c004f99..c1515239d9 100644
--- a/docs/latex/wx/url.tex
+++ b/docs/latex/wx/url.tex
@@ -109,8 +109,7 @@ Returns the initialized stream. You will have to delete it yourself.
 
 \wxheading{See also}
 
-%\helpref{wxInputStream}{wxinputstream}
-wxInputStream
+\helpref{wxInputStream}{wxinputstream}
 
 %
 % SetDefaultProxy
