X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2286341c8d8c72b3eb65ffe23cfc8756f841b1c3..b0ee47ff76c278c053ac2ad36bb3129b0fcd050f:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index d261bb5fae..7c1c99b309 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -204,6 +204,12 @@ and refreshes the window.
 
 Sets the number of fields, and optionally the field widths.
 
+\pythonnote{Only the first parameter is accepted.  Use SetStatusWidths
+to set the widths of the fields.}
+
+\perlnote{In wxPerl this function acceps only the {\tt n} parameter.
+Use SetStatusWidths to set the field widths.}
+
 \wxheading{Parameters}
 
 \docparam{number}{The number of fields.}
@@ -212,6 +218,14 @@ Sets the number of fields, and optionally the field widths.
 in pixels. A value of -1 indicates that the field is variable width; at least one
 field must be -1.}
 
+\membersection{wxStatusBar::SetMinHeight}\label{wxstatusbarsetminheight}
+
+\func{void}{SetMinHeight}{\param{int}{ height}}
+
+Sets the minimal possible hight for the status bar. The real height may be
+bigger than the height specified here depending on the size of the font used by
+the status bar.
+
 \membersection{wxStatusBar::SetStatusText}\label{wxstatusbarsetstatustext}
 
 \func{virtual void}{SetStatusText}{\param{const wxString\& }{text}, \param{int}{ i = 0}}
@@ -255,4 +269,5 @@ variable fields.
 \pythonnote{Only a single parameter is required, a Python list of
 integers.}
 
+\perlnote{In wxPerl this method takes as parameters the field widths.}
 
