X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2286341c8d8c72b3eb65ffe23cfc8756f841b1c3..7c6ad433beab62c3108b61bbc2b682302607f6bf:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index d261bb5fae..58a882beb5 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -22,7 +22,7 @@ be variable length according to the size of the window.
 
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{\windowstyle{wxSB\_SIZEGRIP}}{On Windows 95, displays a gripper at right-hand side of
+\twocolitem{\windowstyle{wxST\_SIZEGRIP}}{On Windows 95, displays a gripper at right-hand side of
 the status bar.}
 \end{twocollist}
 
@@ -46,8 +46,7 @@ from an {\bf OnSize} event handler.
 Default constructor.
 
 \func{}{wxStatusBar}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
-\param{const wxPoint\&}{ pos = wxDefaultPosition},\rtfsp
-\param{const wxSize\&}{ size = wxDefaultSize}, \param{long}{ style = 0},\rtfsp
+\param{long}{ style = wxST\_SIZEGRIP},\rtfsp
 \param{const wxString\& }{name = ``statusBar"}}
 
 Constructor, creating the window.
@@ -58,12 +57,6 @@ Constructor, creating the window.
 
 \docparam{id}{The window identifier. It may take a value of -1 to indicate a default value.}
 
-\docparam{pos}{The window position. A value of (-1, -1) indicates a default position, chosen by
-either the windowing system or wxWindows, depending on platform.}
-
-\docparam{size}{The window size. A value of (-1, -1) indicates a default size, chosen by
-either the windowing system or wxWindows, depending on platform.}
-
 \docparam{style}{The window style. See \helpref{wxStatusBar}{wxstatusbar}.}
 
 \docparam{name}{The name of the window. This parameter is used to associate a name with the item,
@@ -83,8 +76,7 @@ Destructor.
 \membersection{wxStatusBar::Create}\label{wxstatusbarcreate}
 
 \func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
-\param{const wxPoint\&}{ pos = wxDefaultPosition},\rtfsp
-\param{const wxSize\&}{ size = wxDefaultSize}, \param{long}{ style = 0},\rtfsp
+\param{long}{ style = wxST\_SIZEGRIP},\rtfsp
 \param{const wxString\& }{name = ``statusBar"}}
 
 Creates the window, for two-step construction.
@@ -105,12 +97,15 @@ Returns the size and position of a fields internal bounding rectangle.
 
 \wxheading{Return value}
 
-TRUE if the field index is valid, FALSE otherwise.
+true if the field index is valid, false otherwise.
 
 \wxheading{See also}
 
 \helpref{wxRect}{wxrect}
 
+\perlnote{In wxPerl this function returns a {\tt Wx::Rect} if the field
+  index is valid, {\tt undef} otherwise.}
+
 \membersection{wxStatusBar::GetFieldsCount}\label{wxstatusbargetfieldscount}
 
 \constfunc{int}{GetFieldsCount}{\void}
@@ -135,82 +130,50 @@ The status field string if the field is valid, otherwise the empty string.
 
 \helpref{wxStatusBar::SetStatusText}{wxstatusbarsetstatustext}
 
-\membersection{wxStatusBar::DrawField}\label{wxstatusbardrawfield}
-
-\func{virtual void}{DrawField}{\param{wxDC\& }{dc}, \param{int }{i}}
-
-Draws a field, including shaded borders and text.
-
-\wxheading{Parameters}
-
-\docparam{dc}{The device context to draw onto.}
-
-\docparam{i}{The field to be drawn.}
+\membersection{wxStatusBar::PopStatusText}\label{wxstatusbarpopstatustext}
 
-\wxheading{See also}
-
-\helpref{wxStatusBar::DrawFieldText}{wxstatusbardrawfieldtext}
-
-\membersection{wxStatusBar::DrawFieldText}\label{wxstatusbardrawfieldtext}
+\func{void}{PopStatusText}{\param{int}{ field = 0}}
 
-\func{virtual void}{DrawFieldText}{\param{wxDC\& }{dc}, \param{int }{i}}
-
-Draws a field's text.
-
-\wxheading{Parameters}
-
-\docparam{dc}{The device context to draw onto.}
-
-\docparam{i}{The field whose text is to be drawn.}
+Sets the field text to the top of the stack, and pops the stack of saved
+strings.
 
 \wxheading{See also}
 
-\helpref{wxStatusBar::DrawField}{wxstatusbardrawfield}
-
-\membersection{wxStatusBar::InitColours}\label{wxstatusbarinitcolours}
+\helpref{wxStatusBar::PushStatusText}{wxstatusbarpushstatustext}
 
-\func{virtual void}{InitColours}{\void}
+\membersection{wxStatusBar::PushStatusText}\label{wxstatusbarpushstatustext}
 
-Sets up the background colour and shading pens using suitable system colours (Windows) or tasteful shades
-of grey (other platforms).
+\func{void}{PushStatusText}{\param{const wxString&}{ string}, \param{int}{ field = 0}}
 
-\wxheading{Remarks}
-
-This function is called when the window is created, and also
-from \helpref{wxStatusBar::OnSysColourChanged}{wxstatusbaronsyscolourchanged} on Windows.
+Saves the current field text in a per field stack, and sets the field text
+to the string passed as argument.
 
-\wxheading{See also}
+\membersection{wxStatusBar::SetFieldsCount}\label{wxstatusbarsetfieldscount}
 
-\helpref{wxStatusBar::OnSysColourChanged}{wxstatusbaronsyscolourchanged}
+\func{virtual void}{SetFieldsCount}{\param{int}{ number = 1}, \param{int* }{widths = NULL}}
 
-\membersection{wxStatusBar::OnSysColourChanged}\label{wxstatusbaronsyscolourchanged}
+Sets the number of fields, and optionally the field widths.
 
-\func{void}{OnSysColourChanged}{\param{wxSysColourChangedEvent\& }{event}}
+\pythonnote{Only the first parameter is accepted.  Use SetStatusWidths
+to set the widths of the fields.}
 
-Handles a system colour change by calling \helpref{wxStatusBar::InitColours}{wxstatusbarinitcolours},
-and refreshes the window.
+\perlnote{In wxPerl this function accepts only the {\tt n} parameter.
+Use SetStatusWidths to set the field widths.}
 
 \wxheading{Parameters}
 
-\docparam{event}{The colour change event.}
-
-\wxheading{See also}
-
-\helpref{wxStatusBar::InitColours}{wxstatusbarinitcolours}
+\docparam{number}{The number of fields.}
 
-\membersection{wxStatusBar::SetFieldsCount}\label{wxstatusbarsetfieldscount}
+\docparam{widths}{An array of {\it n} integers interpreted in the same way as
+in \helpref{SetStatusWidths}{wxstatusbarsetstatuswidths}}
 
-\func{virtual void}{SetFieldsCount}{\param{int}{ number = 1}, \param{int* }{widths = NULL}}
+\membersection{wxStatusBar::SetMinHeight}\label{wxstatusbarsetminheight}
 
-Sets the number of fields, and optionally the field widths.
+\func{void}{SetMinHeight}{\param{int}{ height}}
 
-\wxheading{Parameters}
-
-\docparam{number}{The number of fields.}
-
-\docparam{widths}{An array of {\it n} integers, each of which is a status field width
-in pixels. A value of -1 indicates that the field is variable width; at least one
-field must be -1.}
+Sets the minimal possible hight for the status bar. The real height may be
+bigger than the height specified here depending on the size of the font used by
+the status bar.
 
 \membersection{wxStatusBar::SetStatusText}\label{wxstatusbarsetstatustext}
 
@@ -232,15 +195,27 @@ Sets the text for one field.
 
 \func{virtual void}{SetStatusWidths}{\param{int}{ n}, \param{int *}{widths}}
 
-Sets the widths of the fields in the status line.
+Sets the widths of the fields in the status line. There are two types of
+fields: fixed widths one and variable width fields. For the fixed width fields
+you should specify their (constant) width in pixels. For the variable width
+fields, specify a negative number which indicates how should the field expand:
+the space left for all variable width fields is divided between them according
+to the absolute value of this number. A variable width field with width of $-2$
+gets twice as much of it as a field with width $-1$ and so on.
+
+For example, to create one fixed width field of width $50$ in the right part of
+the status bar and two more fields which get $66$\% and $33$\% of the remaining
+space correspondingly, you should use an array containing $-2$, $-1$ and $100$.
 
 \wxheading{Parameters}
 
-\docparam{n}{The number of fields in the status bar.}
+\docparam{n}{The number of fields in the status bar. Must be equal to the
+number passed to \helpref{SetFieldsCount}{wxstatusbarsetfieldscount} the last
+time it was called.}
 
-\docparam{widths}{Must contain an array of {\it n} integers, each of which is a status field width
-in pixels. A value of -1 indicates that the field is variable width; at least one
-field must be -1. You should delete this array after calling {\bf SetStatusWidths}.}
+\docparam{widths}{Contains an array of {\it n} integers, each of which is
+either an absolute status field width in pixels if positive or indicates a
+variable width field if negative}
 
 \wxheading{Remarks}
 
@@ -255,4 +230,5 @@ variable fields.
 \pythonnote{Only a single parameter is required, a Python list of
 integers.}
 
+\perlnote{In wxPerl this method takes as parameters the field widths.}
 
