X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2259e007898a6ffa793e129845e1fa416b42e6d3..5c5428f9132822d5d39b02c46dd89464adff9f1f:/docs/latex/wx/expr.tex

diff --git a/docs/latex/wx/expr.tex b/docs/latex/wx/expr.tex
index ad8b3e63db..83381dfdde 100644
--- a/docs/latex/wx/expr.tex
+++ b/docs/latex/wx/expr.tex
@@ -46,8 +46,8 @@ Construct a floating point expression.
 Construct a list expression. The list's nodes' data should
 themselves be {\bf wxExpr}s.
 
-The current version of this library no longer uses the {\bf wxList}
-internally, so this constructor turns the list into its internal
+wxExpr no longer uses the {\bf wxList} internally,
+so this constructor turns the list into its internal
 format (assuming a non-nested list) and then deletes the supplied
 list.
 
@@ -352,13 +352,13 @@ Construct a new, unhashed database, with an optional error handler. The
 error handler must be a function returning a bool and taking an integer and a string
 argument. When an error occurs when reading or writing a database, this function is
 called. The error is given as the first argument (currently one of WXEXPR\_ERROR\_GENERAL,
-WXEXPR\_ERROR\_SYNTAX) and an error message is given as the second argument. If FALSE
+WXEXPR\_ERROR\_SYNTAX) and an error message is given as the second argument. If false
 is returned by the error handler, processing of the wxExpr operation stops.
 
 Another way of handling errors is simply to call \helpref{wxExprDatabase::GetErrorCount}{wxexprdatabasegeterrorcount} after
 the operation, to check whether errors have occurred, instead of installing an error handler.
 If the error count is more than zero, \helpref{wxExprDatabase::Write}{wxexprdatabasewrite} and
-\rtfsp\helpref{wxExprDatabase::Read}{wxexprdatabaseread} will return FALSE to
+\rtfsp\helpref{wxExprDatabase::Read}{wxexprdatabaseread} will return false to
 the application.
 
 For example:
@@ -370,13 +370,12 @@ bool myErrorHandler(int err, chat *msg)
   {
     wxMessageBox(msg, "Syntax error");
   }
-  return FALSE;
+  return false;
 }
 
 wxExprDatabase database(myErrorHandler);
 \end{verbatim}
 
-
 \func{}{wxExprDatabase}{\param{wxExprType}{ type}, \param{const wxString\&}{attribute},
 \rtfsp\param{int}{ size = 500}, \param{proioErrorHandler}{ handler = 0}}
 
@@ -477,13 +476,13 @@ in the database constructor having the given string value.
 
 \func{bool}{Read}{\param{const wxString\&}{ filename}}
 
-Reads in the given file, returning TRUE if successful.
+Reads in the given file, returning true if successful.
 
 \membersection{wxExprDatabase::ReadFromString}\label{wxexprdatabasereadfromstring}
 
 \func{bool}{ReadFromString}{\param{const wxString\&}{ buffer}}
 
-Reads a Prolog database from the given string buffer, returning TRUE if
+Reads a Prolog database from the given string buffer, returning true if
 successful.
 
 \membersection{wxExprDatabase::Write}\label{wxexprdatabasewrite}
