X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2259e007898a6ffa793e129845e1fa416b42e6d3..1ec5cbf3de62355577408ced5017c1844c71edaf:/docs/latex/wx/postscpt.tex

diff --git a/docs/latex/wx/postscpt.tex b/docs/latex/wx/postscpt.tex
index 425d22d4e7..c901a61772 100644
--- a/docs/latex/wx/postscpt.tex
+++ b/docs/latex/wx/postscpt.tex
@@ -27,7 +27,7 @@ Constructor. {\it output} is an optional file for printing to, and if
 various parameters. {\it parent} is the parent of the printer dialog box.
 
 Use the {\it Ok} member to test whether the constructor was successful
-in creating a useable device context.
+in creating a usable device context.
 
 See \helpref{Printer settings}{printersettings} for functions to set and
 get PostScript printing settings.
@@ -36,4 +36,17 @@ This constructor and the global printer settings are now deprecated;
 use the wxPrintData constructor instead.
 
 
+\membersection{wxPostScriptDC::SetResolution}\label{wxpostscriptdcsetresolution}
+
+\func{static void}{SetResolution}{\param{int}{ ppi}}
+
+Set resolution (in pixels per inch) that will be used in PostScript
+output. Default is 720ppi.
+
+\membersection{wxPostScriptDC::GetResolution}\label{wxpostscriptdcgetresolution}
+
+\func{static int}{GetResolution}{\void}
+
+Return resolution used in PostScript output. See 
+\helpref{SetResolution}{wxpostscriptdcsetresolution}.
 
