X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2245b2b2c3339ecf023e5880caa803610a5d1907..71aba8333cc915afff9e740c944f7fa7247abacb:/docs/latex/wx/dropsrc.tex

diff --git a/docs/latex/wx/dropsrc.tex b/docs/latex/wx/dropsrc.tex
index 6223ea5e88..041c31c227 100644
--- a/docs/latex/wx/dropsrc.tex
+++ b/docs/latex/wx/dropsrc.tex
@@ -106,10 +106,10 @@ slow.
 
 \docparam{effect}{The effect to implement. One of wxDragCopy, wxDragMove and wxDragNone. }
 
-\docparam{scrolling}{TRUE if the window is scrolling. MSW only. }
+\docparam{scrolling}{true if the window is scrolling. MSW only. }
 
 \wxheading{Return value}
 
-Return FALSE if you want default feedback, or TRUE if you implement your own
+Return false if you want default feedback, or true if you implement your own
 feedback. The return values is ignored under GTK.
 
