X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2209baaee3a8578450e204593b79ed155f340f68..b44f1ca20bd4d5c6970228e476ce74d4347a6ff3:/docs/latex/wx/renderer.tex?ds=sidebyside

diff --git a/docs/latex/wx/renderer.tex b/docs/latex/wx/renderer.tex
index 9678cb65ae..2f2a7d6fcd 100644
--- a/docs/latex/wx/renderer.tex
+++ b/docs/latex/wx/renderer.tex
@@ -92,9 +92,9 @@ No base class
 Virtual destructor as for any base class.
 
 
-\membersection{wxRendererNative::DrawCheckButton}\label{wxrenderernativedrawcheckbutton}
+\membersection{wxRendererNative::DrawCheckBox}\label{wxrenderernativedrawcheckbox}
 
-\func{void}{DrawCheckButton}{\param{wxWindow *}{win}, \param{wxDC\& }{dc}, \param{const wxRect\& }{rect}, \param{int }{flags}}
+\func{void}{DrawCheckBox}{\param{wxWindow *}{win}, \param{wxDC\& }{dc}, \param{const wxRect\& }{rect}, \param{int }{flags}}
 
 Draw a check box (used by wxDataViewCtrl).
 
@@ -236,4 +236,3 @@ Set the renderer to use, passing {\tt NULL} reverts to using the default
 renderer (the global renderer must always exist).
 
 Return the previous renderer used with Set() or {\tt NULL} if none.
-
