X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2209baaee3a8578450e204593b79ed155f340f68..813210ca7e63cb0a8e2a145664c8b638ea65c15e:/docs/latex/wx/renderer.tex

diff --git a/docs/latex/wx/renderer.tex b/docs/latex/wx/renderer.tex
index 9678cb65ae..17469cdc33 100644
--- a/docs/latex/wx/renderer.tex
+++ b/docs/latex/wx/renderer.tex
@@ -52,6 +52,11 @@ the rendering functions should always prepare it.
 combination of the \texttt{wxCONTROL\_XXX} constants below.
 \end{itemize}
 
+Note that each drawing function restores the \helpref{wxDC}{wxdc} attributes if
+it changes them, so it is safe to assume that the same pen, brush and colours
+that were active before the call to this function are still in effect after it.
+
+
 \wxheading{Constants}
 
 The following rendering flags are defined:
@@ -92,9 +97,9 @@ No base class
 Virtual destructor as for any base class.
 
 
-\membersection{wxRendererNative::DrawCheckButton}\label{wxrenderernativedrawcheckbutton}
+\membersection{wxRendererNative::DrawCheckBox}\label{wxrenderernativedrawcheckbox}
 
-\func{void}{DrawCheckButton}{\param{wxWindow *}{win}, \param{wxDC\& }{dc}, \param{const wxRect\& }{rect}, \param{int }{flags}}
+\func{void}{DrawCheckBox}{\param{wxWindow *}{win}, \param{wxDC\& }{dc}, \param{const wxRect\& }{rect}, \param{int }{flags}}
 
 Draw a check box (used by wxDataViewCtrl).
 
@@ -236,4 +241,3 @@ Set the renderer to use, passing {\tt NULL} reverts to using the default
 renderer (the global renderer must always exist).
 
 Return the previous renderer used with Set() or {\tt NULL} if none.
-
