X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/20f82e13721f920ce1fe337de1b900899e2becb0..595050924394ebc839c496b6b70f52ddaee32e0d:/docs/latex/wx/tglbtn.tex

diff --git a/docs/latex/wx/tglbtn.tex b/docs/latex/wx/tglbtn.tex
index 4a3e23dc3a..78b0413f6a 100644
--- a/docs/latex/wx/tglbtn.tex
+++ b/docs/latex/wx/tglbtn.tex
@@ -15,12 +15,9 @@ wxToggleButton is a button that stays pressed when clicked by the user. In
 other words, it is similar to \helpref{wxCheckBox}{wxcheckbox} in
 functionality but looks like a \helpref{wxButton}{wxbutton}.
 
-You can see wxToggleButton in action in the sixth page of the 
+You can see wxToggleButton in action in the sixth page of the
 \helpref{controls}{samplecontrols} sample.
 
-{\bf NB:} This class is not available under wxUniversal ports such
-as wxX11.
-
 \wxheading{Derived from}
 
 \helpref{wxControl}{wxcontrol}\\
@@ -116,10 +113,9 @@ Returns {\tt true} if it is pressed, {\tt false} otherwise.
 
 \func{void}{SetValue}{\param{const bool}{ state}}
 
-Sets the toggle button to the given state. This does not cause a 
+Sets the toggle button to the given state. This does not cause a
 {\tt EVT\_TOGGLEBUTTON} event to be emitted.
 
 \wxheading{Parameters}
 
 \docparam{state}{If {\tt true}, the button is pressed.}
-
