X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/20b35a6916b9b54af4bbfe4227393c08cd9a2724..f98488c8ca626661a4f414bdf38f45254fecb03e:/docs/latex/wx/gbspan.tex

diff --git a/docs/latex/wx/gbspan.tex b/docs/latex/wx/gbspan.tex
index a38eeb6a7a..5cba4474be 100644
--- a/docs/latex/wx/gbspan.tex
+++ b/docs/latex/wx/gbspan.tex
@@ -14,7 +14,6 @@ No base class
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-
 \membersection{wxGBSpan::wxGBSpan}\label{wxgbspanwxgbspan}
 
 \func{}{wxGBSpan}{\void}
@@ -25,44 +24,39 @@ Construct a new wxGBSpan, optionally setting the rowspan and colspan.
 The default is (1,1).  (Meaning that the item occupies one cell in
 each direction.
 
-
 \membersection{wxGBSpan::GetColspan}\label{wxgbspangetcolspan}
 
 \constfunc{int}{GetColspan}{\void}
 
 Get the current colspan value.
 
-
 \membersection{wxGBSpan::GetRowspan}\label{wxgbspangetrowspan}
 
 \constfunc{int}{GetRowspan}{\void}
 
 Get the current rowspan value.
 
-
 \membersection{wxGBSpan::SetColspan}\label{wxgbspansetcolspan}
 
 \func{void}{SetColspan}{\param{int }{colspan}}
 
 Set a new colspan value.
 
-
 \membersection{wxGBSpan::SetRowspan}\label{wxgbspansetrowspan}
 
 \func{void}{SetRowspan}{\param{int }{rowspan}}
 
 Set a new rowspan value.
 
-
 \membersection{wxGBSpan::operator!}\label{wxgbspanoperatorunknown}
 
 \constfunc{bool}{operator!}{\param{const wxGBSpan\& }{o}}
 
-Is the wxGBSpan valid?  (An invalid wxGBPosition is (-1,-1). )
-
+Is the wxGBSpan valid?  (An invalid wxGBSpan is (-1,-1). )
 
 \membersection{wxGBSpan::operator==}\label{wxgbspanoperatorequal}
 
 \constfunc{bool operator}{operator==}{\param{const wxGBSpan\& }{o}}
 
 Compare equality of two wxGBSpans.
+
