X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1facd32a75f3ef190a336e96fabf17632ade7228..240889a18cb17f20884c6ce36e52a6dcf589bb08:/docs/latex/wx/tempfile.tex

diff --git a/docs/latex/wx/tempfile.tex b/docs/latex/wx/tempfile.tex
index 6263e615a5..01a31ffdb2 100644
--- a/docs/latex/wx/tempfile.tex
+++ b/docs/latex/wx/tempfile.tex
@@ -85,7 +85,7 @@ Write to the file, return TRUE on success, FALSE on failure.
 
 Write to the file, return TRUE on success, FALSE on failure.
 
-The second argument specifies is only meaningful in Unicode build of wxWindows when
+The second argument is only meaningful in Unicode build of wxWindows when
 {\it conv} is used to convert {\it str} to multibyte representation.
 
 \membersection{wxTempFile::Commit}\label{wxtempfilecommit}
