X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1ec5cbf3de62355577408ced5017c1844c71edaf..dc484d491b15355285a89da275c58c2ef247d1f4:/docs/latex/wx/log.tex?ds=inline

diff --git a/docs/latex/wx/log.tex b/docs/latex/wx/log.tex
index fa31caabb9..04e2889690 100644
--- a/docs/latex/wx/log.tex
+++ b/docs/latex/wx/log.tex
@@ -11,7 +11,7 @@
 
 \section{\class{wxLog}}\label{wxlog}
 
-wxLog class defines the interface for the {\it log targets} used by wxWindows
+wxLog class defines the interface for the {\it log targets} used by wxWidgets
 logging functions as explained in the \helpref{wxLog overview}{wxlogoverview}.
 The only situations when you need to directly use this class is when you want
 to derive your own log target because the existing ones don't satisfy your
@@ -23,7 +23,7 @@ completely) the timestamp on the messages.
 Otherwise, it is completely hidden behind the {\it wxLogXXX()} functions and
 you may not even know about its existence.
 
-See \helpref{log overview}{wxlogoverview} for the descriptions of wxWindows
+See \helpref{log overview}{wxlogoverview} for the descriptions of wxWidgets
 logging facilities.
 
 \wxheading{Derived from}
@@ -36,7 +36,7 @@ No base class
 
 \latexignore{\rtfignore{\wxheading{Function groups}}}
 
-\membersection{Static functions}
+\membersection{Global functions}
 
 The functions in this section work with and manipulate the active log target.
 The \helpref{OnLog()}{wxlogonlog} is called by the {\it wxLogXXX()} functions
@@ -54,7 +54,7 @@ situations because it may easily lead to a loss of messages.
 \helpref{Suspend}{wxlogsuspend}\\
 \helpref{Resume}{wxlogresume}
 
-\membersection{Logging functions}
+\membersection{Logging functions}\label{loggingfunctions}
 
 There are two functions which must be implemented by any derived class to
 actually process the log messages: \helpref{DoLog}{wxlogdolog} and
@@ -155,7 +155,9 @@ window on the corresponding error message. If you wish to enable it, please use
 \helpref{SetTimestamp}{wxlogsettimestamp}\\
 \helpref{GetTimestamp}{wxloggettimestamp}\\
 \helpref{SetTraceMask}{wxlogsettracemask}\\
-\helpref{GetTraceMask}{wxloggettracemask}
+\helpref{GetTraceMask}{wxloggettracemask}\\
+\helpref{SetRepetitionCounting}{wxlogsetrepetitioncounting}\\
+\helpref{GetRepetitionCounting}{wxloggetrepetitioncounting}
 
 %%%%% MEMBERS HERE %%%%%
 \helponly{\insertatlevel{2}{
@@ -172,6 +174,7 @@ Add the {\it mask} to the list of allowed masks for
 \helpref{wxLogTrace}{wxlogtrace}.
 
 \wxheading{See also}
+
 \helpref{RemoveTraceMask}{wxlogremovetracemask}
 \helpref{GetTraceMasks}{wxloggettracemasks}
 
@@ -183,15 +186,17 @@ Removes all trace masks previously set with
 \helpref{AddTraceMask}{wxlogaddtracemask}.
 
 \wxheading{See also}
+
 \helpref{RemoveTraceMask}{wxlogremovetracemask}
 
 \membersection{wxLog::GetTraceMasks}\label{wxloggettracemasks}
 
-\func{static const wxArrayString &}{GetTraceMasks}{\void}
+\func{static const wxArrayString \&}{GetTraceMasks}{\void}
 
 Returns the currently allowed list of string trace masks.
 
 \wxheading{See also}
+
 \helpref{AddTraceMask}{wxlogaddtracemask}.
 
 \membersection{wxLog::OnLog}\label{wxlogonlog}
@@ -212,7 +217,9 @@ Returns the pointer to the active log target (may be NULL).
 \func{static wxLog *}{SetActiveTarget}{\param{wxLog * }{ logtarget}}
 
 Sets the specified log target as the active one. Returns the pointer to the
-previous active log target (may be NULL).
+previous active log target (may be NULL).  To suppress logging use a new
+instance of wxLogNull not NULL.  If the active log target is set to NULL a
+new default log target will be created when logging occurs.
 
 \membersection{wxLog::Suspend}\label{wxlogsuspend}
 
@@ -228,7 +235,7 @@ logging immediately without waiting for \helpref{Flush}{wxlogflush} to be
 called (the standard GUI log target only shows the log dialog when it is
 flushed, so Suspend() works as expected with it).
 
-\wxheading{See also:}
+\wxheading{See also}
 
 \helpref{Resume}{wxlogresume},\\
 \helpref{wxLogNull}{wxlogoverview}
@@ -287,13 +294,13 @@ is already empty, nothing happens.
 
 Flushes the current log target if any, does nothing if there is none.
 
-See also:
+\wxheading{See also}
 
 \helpref{Flush}{wxlogflush}
 
 \membersection{wxLog::SetVerbose}\label{wxlogsetverbose}
 
-\func{static void}{SetVerbose}{\param{bool }{ verbose = TRUE}}
+\func{static void}{SetVerbose}{\param{bool }{ verbose = true}}
 
 Activates or deactivates verbose mode in which the verbose messages are
 logged as the normal ones instead of being silently dropped.
@@ -317,6 +324,21 @@ and not sent to the active log target.
 
 Returns the current log level limit.
 
+\membersection{wxLog::SetRepetitionCounting}\label{wxlogsetrepetitioncounting}
+
+\func{static void}{SetRepetitionCounting}{\param{bool }{ repetCounting = true}}
+
+Enables logging mode in which a log message is logged once, and in case exactly
+the same message successively repeats one or more times, only the number of 
+repetitions is logged.
+
+\membersection{wxLog::GetRepetitionCounting}\label{wxloggetrepetitioncounting}
+
+\func{static bool}{GetRepetitionCounting}{\void}
+
+Returns whether the repetition counting mode is enabled.
+
+
 \membersection{wxLog::SetTimestamp}\label{wxlogsettimestamp}
 
 \func{void}{SetTimestamp}{\param{const char * }{ format}}
@@ -348,7 +370,7 @@ for details.
 
 \func{static bool}{IsAllowedTraceMask}{\param{const wxChar *}{mask}}
 
-Returns TRUE if the {\it mask} is one of allowed masks for
+Returns true if the {\it mask} is one of allowed masks for
 \helpref{wxLogTrace}{wxlogtrace}.
 
 See also: \helpref{AddTraceMask}{wxlogaddtracemask},
@@ -399,14 +421,14 @@ delete wxLog::SetActiveTarget(...something else or NULL...);
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxLogChain::wxLogChain}\label{wxlogchainwxlogchain}
+\membersection{wxLogChain::wxLogChain}\label{wxlogchainctor}
 
 \func{}{wxLogChain}{\param{wxLog *}{logger}}
 
 Sets the specified {\tt logger} (which may be {\tt NULL}) as the default log
 target but the log messages are also passed to the previous log target if any.
 
-\membersection{wxLogChain::\destruct{wxLogChain}}
+\membersection{wxLogChain::\destruct{wxLogChain}}\label{wxlogchaindtor}
 
 \func{}{\destruct{wxLogChain}}{\void}
 
@@ -423,8 +445,8 @@ NULL}).
 
 \constfunc{bool}{IsPassingMessages}{\void}
 
-Returns {\tt TRUE} if the messages are passed to the previously active log
-target (default) or {\tt FALSE} if \helpref{PassMessages}{wxlogchainpassmessages}
+Returns {\tt true} if the messages are passed to the previously active log
+target (default) or {\tt false} if \helpref{PassMessages}{wxlogchainpassmessages}
 had been called.
 
 \membersection{wxLogChain::PassMessages}\label{wxlogchainpassmessages}
@@ -432,17 +454,17 @@ had been called.
 \func{void}{PassMessages}{\param{bool }{passMessages}}
 
 By default, the log messages are passed to the previously active log target.
-Calling this function with {\tt FALSE} parameter disables this behaviour
+Calling this function with {\tt false} parameter disables this behaviour
 (presumably temporarily, as you shouldn't use wxLogChain at all otherwise) and
 it can be reenabled by calling it again with {\it passMessages} set to {\tt
-TRUE}.
+true}.
 
 \membersection{wxLogChain::SetLog}\label{wxlogchainsetlog}
 
 \func{void}{SetLog}{\param{wxLog *}{logger}}
 
 Sets another log target to use (may be {\tt NULL}). The log target specified
-in the \helpref{constructor}{wxlogchainwxlogchain} or in a previous call to
+in the \helpref{constructor}{wxlogchainctor} or in a previous call to
 this function is deleted.
 
 This doesn't change the old log target value (the one the messages are
@@ -453,9 +475,9 @@ object was created.
 
 \section{\class{wxLogGui}}\label{wxloggui}
 
-This is the default log target for the GUI wxWindows applications. It is passed
+This is the default log target for the GUI wxWidgets applications. It is passed
 to \helpref{wxLog::SetActiveTarget}{wxlogsetactivetarget} at the program
-startup and is deleted by wxWindows during the program shut down.
+startup and is deleted by wxWidgets during the program shut down.
 
 \wxheading{Derived from}
 
@@ -467,7 +489,7 @@ startup and is deleted by wxWindows during the program shut down.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxLogGui::wxLogGui}
+\membersection{wxLogGui::wxLogGui}\label{wxlogguictor}
 
 \func{}{wxLogGui}{\void}
 
@@ -480,7 +502,7 @@ Default constructor.
 This class allows to temporarily suspend logging. All calls to the log
 functions during the life time of an object of this class are just ignored.
 
-In particular, it can be used to suppress the log messages given by wxWindows
+In particular, it can be used to suppress the log messages given by wxWidgets
 itself but it should be noted that it is rarely the best way to cope with this
 problem as {\bf all} log messages are suppressed, even if they indicate a
 completely different error than the one the programmer wanted to suppress.
@@ -500,7 +522,7 @@ For instance, the example of the overview:
 
   wxLogMessage("..."); // ok
 \end{verbatim}
-}
+}%
 
 would be better written as:
 
@@ -520,7 +542,7 @@ would be better written as:
       ...
   }
 \end{verbatim}
-}
+}%
 
 \wxheading{Derived from}
 
@@ -532,13 +554,13 @@ would be better written as:
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxLogNull::wxLogNull}
+\membersection{wxLogNull::wxLogNull}\label{wxlognullctor}
 
 \func{}{wxLogNull}{\void}
 
 Suspends logging.
 
-\membersection{wxLogNull::\destruct{wxLogNull}}
+\membersection{wxLogNull::\destruct{wxLogNull}}\label{wxlognulldtor}
 
 Resumes logging.
 
@@ -575,7 +597,7 @@ Default ctor installs this object as the current active log target.
 
 This class can be used to redirect the log messages to a C file stream (not to
 be confused with C++ streams). It is the default log target for the non-GUI
-wxWindows applications which send all the output to {\tt stderr}.
+wxWidgets applications which send all the output to {\tt stderr}.
 
 \wxheading{Derived from}
 
@@ -591,7 +613,7 @@ wxWindows applications which send all the output to {\tt stderr}.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxLogStderr::wxLogStderr}
+\membersection{wxLogStderr::wxLogStderr}\label{wxlogstderrctor}
 
 \func{}{wxLogStderr}{\param{FILE }{*fp = NULL}}
 
@@ -604,7 +626,7 @@ Constructs a log target which sends all the log messages to the given
 
 This class can be used to redirect the log messages to a C++ stream.
 
-Please note that this class is only available if wxWindows was compiled with
+Please note that this class is only available if wxWidgets was compiled with
 the standard iostream library support ({\tt wxUSE\_STD\_IOSTREAM} must be on).
 
 \wxheading{Derived from}
@@ -622,7 +644,7 @@ the standard iostream library support ({\tt wxUSE\_STD\_IOSTREAM} must be on).
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxLogStream::wxLogStream}
+\membersection{wxLogStream::wxLogStream}\label{wxlogstreamctor}
 
 \func{}{wxLogStream}{\param{std::ostream }{*ostr = NULL}}
 
@@ -647,12 +669,12 @@ caller previously.
 
 \wxheading{See also}
 
-\helpref{wxLogTextCtrl}{wxlogtextctrl},\\
+\helpref{wxTextCtrl}{wxtextctrl},\\
 \helpref{wxStreamToTextRedirector}{wxstreamtotextredirector}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxLogTextCtrl::wxLogTextCtrl}
+\membersection{wxLogTextCtrl::wxLogTextCtrl}\label{wxlogtextctrlctor}
 
 \func{}{wxLogTextCtrl}{\param{wxTextCtrl }{*textctrl}}
 
@@ -683,9 +705,9 @@ them normally by showing the standard log dialog.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxLogWindow::wxLogWindow}
+\membersection{wxLogWindow::wxLogWindow}\label{wxlogwindowctor}
 
-\func{}{wxLogWindow}{\param{wxFrame }{*parent}, \param{const wxChar }{*title}, \param{bool }{show = {\tt TRUE}}, \param{bool }{passToOld = {\tt TRUE}}}
+\func{}{wxLogWindow}{\param{wxFrame }{*parent}, \param{const wxChar }{*title}, \param{bool }{show = {\tt true}}, \param{bool }{passToOld = {\tt true}}}
 
 Creates the log frame window and starts collecting the messages in it.
 
@@ -695,27 +717,27 @@ Creates the log frame window and starts collecting the messages in it.
 
 \docparam{title}{The title for the log frame}
 
-\docparam{show}{{\tt TRUE} to show the frame initially (default), otherwise
+\docparam{show}{{\tt true} to show the frame initially (default), otherwise
 \helpref{wxLogWindow::Show}{wxlogwindowshow} must be called later.}
 
-\docparam{passToOld}{{\tt TRUE} to process the log messages normally in addition to
-logging them in the log frame (default), {\tt FALSE} to only log them in the
+\docparam{passToOld}{{\tt true} to process the log messages normally in addition to
+logging them in the log frame (default), {\tt false} to only log them in the
 log frame.}
 
 \membersection{wxLogWindow::Show}\label{wxlogwindowshow}
 
-\func{void}{Show}{\param{bool }{show = {\tt TRUE}}}
+\func{void}{Show}{\param{bool }{show = {\tt true}}}
 
 Shows or hides the frame.
 
-\membersection{wxLogWindow::GetFrame}
+\membersection{wxLogWindow::GetFrame}\label{wxlogwindowgetframe}
 
 \constfunc{wxFrame *}{GetFrame}{\void}
 
 Returns the associated log frame window. This may be used to position or resize
 it but use \helpref{wxLogWindow::Show}{wxlogwindowshow} to show or hide it.
 
-\membersection{wxLogWindow::OnFrameCreate}
+\membersection{wxLogWindow::OnFrameCreate}\label{wxlogwindowonframecreate}
 
 \func{virtual void}{OnFrameCreate}{\param{wxFrame }{*frame}}
 
@@ -724,13 +746,13 @@ any extra initializations.
 
 \membersection{wxLogWindow::OnFrameClose}\label{wxlogwindowonframeclose}
 
-\func{virtual void}{OnFrameClose}{\param{wxFrame }{*frame}}
+\func{virtual bool}{OnFrameClose}{\param{wxFrame }{*frame}}
 
 Called if the user closes the window interactively, will not be
 called if it is destroyed for another reason (such as when program
 exits).
 
-Return {\tt TRUE} from here to allow the frame to close, {\tt FALSE} to
+Return {\tt true} from here to allow the frame to close, {\tt false} to
 prevent this from happening.
 
 \wxheading{See also}
