X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1de8d512b7c844d67b2dab36addc89868e68c9b6..048128e086f0eacc6e4cd1b16b966c641676a177:/docs/latex/wx/pen.tex

diff --git a/docs/latex/wx/pen.tex b/docs/latex/wx/pen.tex
index ae9677b3ba..e4353792b5 100644
--- a/docs/latex/wx/pen.tex
+++ b/docs/latex/wx/pen.tex
@@ -76,7 +76,7 @@ data using the reference counting, are not affected.
 
 \func{}{wxPen}{\void}
 
-Default constructor. The pen will be uninitialised, and \helpref{wxPen::Ok}{wxpenok} will
+Default constructor. The pen will be uninitialised, and \helpref{wxPen:IsOk}{wxpenisok} will
 return false.
 
 \func{}{wxPen}{\param{const wxColour\&}{ colour}, \param{int}{ width = $1$}, \param{int}{ style = {\tt wxSOLID}}}
@@ -93,7 +93,7 @@ Constructs a stippled pen from a stipple bitmap and a width.
 
 \func{}{wxPen}{\param{const wxPen\&}{ pen}}
 
-Copy constructor. This uses reference counting so is a cheap operation.
+Copy constructor, uses \helpref{reference counting}{trefcount}.
 
 \wxheading{Parameters}
 
@@ -154,12 +154,10 @@ is found in the colour database.
 \func{}{\destruct{wxPen}}{\void}
 
 Destructor.
+See \helpref{reference-counted object destruction}{refcountdestruct} for more info.
 
 \wxheading{Remarks}
 
-The destructor may not delete the underlying pen object of the native windowing
-system, since wxBrush uses a reference counting system for efficiency.
-
 Although all remaining pens are deleted when the application exits,
 the application should try to clean up all pens itself. This is because
 wxWidgets cannot know if a pointer to the pen object is stored in an
@@ -239,9 +237,9 @@ Returns the pen width.
 
 \helpref{wxPen::SetWidth}{wxpensetwidth}
 
-\membersection{wxPen::Ok}\label{wxpenok}
+\membersection{wxPen::IsOk}\label{wxpenisok}
 
-\constfunc{bool}{Ok}{\void}
+\constfunc{bool}{IsOk}{\void}
 
 Returns true if the pen is initialised.
 
@@ -329,24 +327,21 @@ Sets the pen width.
 
 \func{wxPen\&}{operator $=$}{\param{const wxPen\& }{pen}}
 
-Assignment operator, using reference counting. Returns a reference
-to `this'.
+Assignment operator, using \helpref{reference counting}{trefcount}.
 
 \membersection{wxPen::operator $==$}\label{wxpenequals}
 
 \func{bool}{operator $==$}{\param{const wxPen\& }{pen}}
 
-Equality operator. Two pens are equal if they contain pointers
-to the same underlying pen data. It does not compare each attribute,
-so two independently-created pens using the same parameters will
-fail the test.
+Equality operator.
+See \helpref{reference-counted object comparison}{refcountequality} for more info.
 
 \membersection{wxPen::operator $!=$}\label{wxpennotequals}
 
 \func{bool}{operator $!=$}{\param{const wxPen\& }{pen}}
 
-Inequality operator. Two pens are not equal if they contain pointers
-to different underlying pen data. It does not compare each attribute.
+Inequality operator.
+See \helpref{reference-counted object comparison}{refcountequality} for more info.
 
 \section{\class{wxPenList}}\label{wxpenlist}
 
