X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1d89c6a711bdd0bd2915f2a34fac5b5f1b834f99..65baafba0e8cd74f2264b7e2f7625ff5bea84864:/docs/latex/wx/window.tex

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index 2fe535f6ad..322ca2ae90 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -1498,8 +1498,11 @@ This is just a wrapper for \helpref{ScrollLines}{wxwindowscrolllines}$(-1)$.
 
 \func{void}{Lower}{\void}
 
-Lowers the window to the bottom of the window hierarchy if it is a managed window (dialog
-or frame).
+Lowers the window to the bottom of the window hierarchy.
+
+\wxheading{See also}
+
+\helpref{Raise}{wxwindowraise}
 
 
 \membersection{wxWindow::MakeModal}\label{wxwindowmakemodal}
@@ -2217,8 +2220,13 @@ remove the event handler.
 
 \func{void}{Raise}{\void}
 
-Raises the window to the top of the window hierarchy if it is a managed window (dialog
-or frame).
+Raises the window to the top of the window hierarchy.
+
+In current version of wxWidgets this works both for manage and child windows.
+
+\wxheading{See also}
+
+\helpref{Lower}{wxwindowlower}
 
 
 \membersection{wxWindow::Refresh}\label{wxwindowrefresh}
@@ -3133,16 +3141,20 @@ value should be used.}
 
 \docparam{sizeFlags}{Indicates the interpretation of other parameters. It is a bit list of the following:
 
-{\bf wxSIZE\_AUTO\_WIDTH}: a -1 width value is taken to indicate
+{\bf wxSIZE\_AUTO\_WIDTH}: a $-1$ width value is taken to indicate
 a wxWidgets-supplied default width.\\
-{\bf wxSIZE\_AUTO\_HEIGHT}: a -1 height value is taken to indicate
+{\bf wxSIZE\_AUTO\_HEIGHT}: a $-1$ height value is taken to indicate
 a wxWidgets-supplied default width.\\
 {\bf wxSIZE\_AUTO}: -1 size values are taken to indicate
 a wxWidgets-supplied default size.\\
 {\bf wxSIZE\_USE\_EXISTING}: existing dimensions should be used
 if -1 values are supplied.\\
-{\bf wxSIZE\_ALLOW\_MINUS\_ONE}: allow dimensions of -1 and less to be interpreted
+{\bf wxSIZE\_ALLOW\_MINUS\_ONE}: allow dimensions of $-1$ and less to be interpreted
 as real dimensions, not default values.
+{\bf wxSIZE\_FORCE}: normally, if the position and the size of the window are
+already the same as the parameters of this function, nothing is done. but with
+this flag a window resize may be forced even in this case (supported in wx
+2.6.2 and later and only implemented for MSW and ignored elsewhere currently)
 }
 
 \wxheading{Remarks}
@@ -3170,7 +3182,7 @@ implements the following methods:\par
 
 \membersection{wxWindow::SetSizeHints}\label{wxwindowsetsizehints}
 
-\func{virtual void}{SetSizeHints}{\param{int}{ minW=-1}, \param{int}{ minH=-1}, \param{int}{ maxW=-1}, \param{int}{ maxH=-1},
+\func{virtual void}{SetSizeHints}{\param{int}{ minW}, \param{int}{ minH}, \param{int}{ maxW=-1}, \param{int}{ maxH=-1},
  \param{int}{ incW=-1}, \param{int}{ incH=-1}}
 
 \func{void}{SetSizeHints}{\param{const wxSize\&}{ minSize},
