X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1d6fcbcc7088e9c104b3dc5b4704a07f728d55ae..6c4fc6a8e3bea19621a328e66b3857ab01a5c15a:/docs/latex/wx/notebook.tex

diff --git a/docs/latex/wx/notebook.tex b/docs/latex/wx/notebook.tex
index 038be5568b..3a714b6f18 100644
--- a/docs/latex/wx/notebook.tex
+++ b/docs/latex/wx/notebook.tex
@@ -412,7 +412,6 @@ This function is deprecated and should not be used in new code. Please use the
 \helpref{wxNotebook::GetSelection}{wxnotebookgetselection}
 
 
-
 \membersection{wxNotebook::ChangeSelection}\label{wxnotebookchangeselection}
 
 \func{int}{ChangeSelection}{\param{size\_t}{ page}}
@@ -422,3 +421,4 @@ Changes the selection for the given page, returning the previous selection.
 The call to this function \emph{does not} generate the page changing events.
 This is the only difference with \helpref{SetSelection}{wxnotebooksetselection}.
 See \helpref{this topic}{progevent} for more info.
+
