X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1d3f4b50d6f529b068586f14de2c3d9bc92a9ac4..40717c90bf265de0a752d637a35cd88cb22bbd05:/docs/latex/wx/dc.tex

diff --git a/docs/latex/wx/dc.tex b/docs/latex/wx/dc.tex
index 7a2a77b2a3..2127df4f0d 100644
--- a/docs/latex/wx/dc.tex
+++ b/docs/latex/wx/dc.tex
@@ -681,12 +681,12 @@ Gets the {\it mapping mode} for the device context (see \helpref{wxDC::SetMapMod
 \constfunc{bool}{GetPartialTextExtents}{\param{const wxString\&  }{text}, 
 \param{wxArrayInt\& }{widths}}
 
-Fills the {\it widths} array with the widths from the begining of 
-{\it text} to the coresponding character of {\it text}.  The generic
+Fills the {\it widths} array with the widths from the beginning of 
+{\it text} to the corresponding character of {\it text}.  The generic
 version simply builds a running total of the widths of each character
 using \helpref{GetTextExtent}{wxdcgettextextent}, however if the
 various platforms have a native API function that is faster or more
-accurate than the generic implementaiton then it should be used
+accurate than the generic implementation then it should be used
 instead. 
 
 \pythonnote{This method only takes the {\it text} parameter and
@@ -707,6 +707,8 @@ Gets the current pen (see \helpref{wxDC::SetPen}{wxdcsetpen}).
 Sets {\it colour} to the colour at the specified location.
 Not available for wxPostScriptDC or wxMetafileDC.
 
+Note that setting a pixel can be done using \helpref{DrawPoint}{wxdcdrawpoint}.
+
 \pythonnote{For wxPython the wxColour value is returned and is not
 required as a parameter.}
 
@@ -1154,7 +1156,7 @@ No base class
 
 \func{}{wxDCClipper}{\param{wxDC\& }{dc}, \param{const wxRect\&}{ rect}}
 
-Constructor: sets the the clipping region for the given device context to the
+Constructor: sets the clipping region for the given device context to the
 specified rectangle.
 
 
