X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1d2bd8475d56ae893f48aa5ca7676f0d9e72825a..a69be60b0f1dac4713e6650ca3ca9fe5a53de062:/docs/latex/wx/notebook.tex

diff --git a/docs/latex/wx/notebook.tex b/docs/latex/wx/notebook.tex
index 0e7c925e66..9f91ec35dc 100644
--- a/docs/latex/wx/notebook.tex
+++ b/docs/latex/wx/notebook.tex
@@ -49,7 +49,7 @@ See also \helpref{window styles overview}{windowstyles}.
 Default constructor.
 
 \func{}{wxNotebook}{\param{wxWindow*}{ parent}, \param{wxWindowID }{id}, \param{const wxPoint\&}{ pos = wxDefaultPosition},
- \param{const wxSize\&}{ size}, \param{long}{ style = 0}, \param{const wxString\& }{name = "notebook"}}
+ \param{const wxSize\&}{ size = wxDefaultSize}, \param{long}{ style = 0}, \param{const wxString\& }{name = "notebook"}}
 
 Constructs a notebook control.
 
@@ -188,7 +188,13 @@ Returns the number of rows in the notebook control.
 
 \constfunc{int}{GetSelection}{\void}
 
-Returns the currently selected page, or -1 if none was selected.
+Returns the currently selected page, or $-1$ if none was selected.
+
+Note that this method may return either the previously or newly selected page
+when called from the {\tt EVT\_NOTEBOOK\_PAGE\_CHANGED} handler depending on
+the platform and so\rtfsp
+\helpref{wxNotebookEvent::GetSelection}{wxnotebookeventgetselection} should be
+used instead in this case.
 
 \membersection{wxNotebook::InsertPage}\label{wxnotebookinsertpage}
 
@@ -257,12 +263,16 @@ ownership of the image list, you must delete it yourself.
 
 Sets the amount of space around each page's icon and label, in pixels.
 
+{\bf NB:} The vertical padding cannot be changed in wxGTK.
+
 \membersection{wxNotebook::SetPageSize}\label{wxnotebooksetpagesize}
 
 \func{void}{SetPageSize}{\param{const wxSize\&}{ size}}
 
 Sets the width and height of the pages.
 
+{\bf NB:} This method is currently not implemented for wxGTK.
+
 \membersection{wxNotebook::SetPageImage}\label{wxnotebooksetpageimage}
 
 \func{bool}{SetPageImage}{\param{int}{ page}, \param{int }{image}}
