X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1d2bd8475d56ae893f48aa5ca7676f0d9e72825a..9154d8cfff9f6a58ccec94bf242086e7e10ea91b:/docs/latex/wx/notebook.tex

diff --git a/docs/latex/wx/notebook.tex b/docs/latex/wx/notebook.tex
index 0e7c925e66..a35d4dd3f6 100644
--- a/docs/latex/wx/notebook.tex
+++ b/docs/latex/wx/notebook.tex
@@ -49,7 +49,7 @@ See also \helpref{window styles overview}{windowstyles}.
 Default constructor.
 
 \func{}{wxNotebook}{\param{wxWindow*}{ parent}, \param{wxWindowID }{id}, \param{const wxPoint\&}{ pos = wxDefaultPosition},
- \param{const wxSize\&}{ size}, \param{long}{ style = 0}, \param{const wxString\& }{name = "notebook"}}
+ \param{const wxSize\&}{ size = wxDefaultSize}, \param{long}{ style = 0}, \param{const wxString\& }{name = "notebook"}}
 
 Constructs a notebook control.
 
@@ -188,7 +188,13 @@ Returns the number of rows in the notebook control.
 
 \constfunc{int}{GetSelection}{\void}
 
-Returns the currently selected page, or -1 if none was selected.
+Returns the currently selected page, or $-1$ if none was selected.
+
+Note that this method may return either the previously or newly selected page
+when called from the {\tt EVT\_NOTEBOOK\_PAGE\_CHANGED} handler depending on
+the platform and so\rtfsp
+\helpref{wxNotebookEvent::GetSelection}{wxnotebookeventgetselection} should be
+used instead in this case.
 
 \membersection{wxNotebook::InsertPage}\label{wxnotebookinsertpage}
 
