X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1d2bd8475d56ae893f48aa5ca7676f0d9e72825a..81f256328c32766ebf9fca0a97b03bb53e24bc6b:/docs/latex/wx/notebook.tex

diff --git a/docs/latex/wx/notebook.tex b/docs/latex/wx/notebook.tex
index 0e7c925e66..dde3ca1a67 100644
--- a/docs/latex/wx/notebook.tex
+++ b/docs/latex/wx/notebook.tex
@@ -188,7 +188,13 @@ Returns the number of rows in the notebook control.
 
 \constfunc{int}{GetSelection}{\void}
 
-Returns the currently selected page, or -1 if none was selected.
+Returns the currently selected page, or $-1$ if none was selected.
+
+Note that this method may return either the previously or newly selected page
+when called from the {\tt EVT\_NOTEBOOK\_PAGE\_CHANGED} handler depending on
+the platform and so\rtfsp
+\helpref{wxNotebookEvent::GetSelection}{wxnotebookeventgetselection} should be
+used instead in this case.
 
 \membersection{wxNotebook::InsertPage}\label{wxnotebookinsertpage}
 
