X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/1d20b7f2c632245f4803e1e6c4b622de8ff9064d..81c882b613b5d99ddb1e5ab69fcd7ebccc287025:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index 6c64a245ea..33d6266ef4 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -16,12 +16,6 @@ wxDynamicLibrary is a class representing dynamically loadable library
 this class to load a library and don't worry about unloading it -- it will be
 done in the objects destructor automatically.
 
-% deprecated now...
-%
-%\wxheading{See also}
-%
-%\helpref{wxDllLoader}{wxdllloader}
-
 \wxheading{Derived from}
 
 No base class.
